\begin{table}%T1
\caption{\label{tab:Sites}Instruments and detectors used in acquiring the observations reported in this paper.}
%\centerline
 {
\begin{tabular}{cccccc}
\hline\hline%\noalign{\smallskip}
Site Abbr&      FTN  (F65)      &         FTS   (E10)        &         ATH1            &         ATH2               &            SALT (A60)    \\
%\noalign{\smallskip}
\hline   
%\noalign{\smallskip} 
Location &    Haleakala, Maui   &   Siding Spring, Australia &     Athens, Greece      &      Athens, Greece        &  Sutherland, South Africa  \\
Lat (N)  &    $\rm 20^d 42^m 27^s $      &      $\rm -31^d 16^m 22^s $         &     $\rm 37^d 59^m 52^s$         &       $\rm 37^d 58^m 07^s $         &        $\rm -32^d 22^m 46^s $       \\
Lon (E)  &   $\rm 203^d 44^m 38^s$       &      $\rm 149^d 04^m 14^s $         &     $\rm 23^d 53^m 36^s$         &       $\rm 23^d 47^m 00^s$          &         $\rm 20^d 48^m 30^s$        \\
Aper     &    200 cm             &        200 cm               &       40 cm              &         40 cm               &        1000 cm              \\
CCD      &   2k $\times$ 2k EEV   &  2k $\times$ 2k EEV          & $1392\times1040$ ATIK   & $1530\times1020$ SBIG      &    2 2k $\times$ 4k  EEV     \\ 
         &      CCD42-40        &     CCD42-40               &        16HR             &        ST-8 XMEI           &    CCD44-82 frame xfer     \\ 
Binning  &    $2\times2$        &       $2\times2$           &        NO               &       $2\times2$           &      $2\times2$            \\
Img scale $\arcsec$/pxl$^{a}$  &    0.28              &            0.28            &        0.31             &         1.03               &        0.28                \\
\hline
\end{tabular}}
\medskip
\par
$^{a}$  Image scale is after binning, where applicable.
\end{table}