\begin{table}%t2
\caption{\label{tab2}Corrected literature solar iron abundances from \ion{Fe}{ii} lines using our line list.}
%\centering
\par
\small \begin{tabular}{cccccc} 
\hline\hline                
{Model}  & {$gf$-value} & $A_{\rm Fe}$(literature) & \# lines &  {Reference} & $A_{\rm Fe}$(corrected) \\
\hline    
HM & laboratory  & 7.480 ($\sigma = 0.084$) & 15 & Hannaford et~al. (\cite{Hannaford1992}) (H92) & 7.470 ($\sigma = 0.030$)  \\
HM & laboratory  & 7.420 ($\sigma = 0.088$) & 13 & Schnabel et~al. (\cite{Schnabel1999}) (S99)  & 7.450 ($\sigma = 0.054$) \\
3D & laboratory  & 7.420 ($\sigma = 0.099$) & 15 & Asplund et~al. (\cite{Asplund2000}) (A00)   & 7.450 ($\sigma = 0.043$) \\
HM & theoretical & 7.490 ($\sigma = 0.083$) & 39 & Biemont et~al. (\cite{Biemont1991}) (B91)   & 7.490 ($\sigma = 0.047$) \\
\hline                                 
\end{tabular}
\end{table}