\begin{table}%t2 
\caption{\label{t_mips}MIPS photometry and the statistical errors.}
\small     
%\centerline
{
\begin{tabular}{lcc}       
\hline\hline       
Object     & 24~\mic \ (1$\sigma$)   & 70~\mic \ (1$\sigma$)\\
           & (mJy)                   & (mJy)\\ 
\hline 
MBM~12-1   & 2.8 (0.4)            & $<$34.4   \\
MBM~12-2   & 142 (0.4)            & 216$^a$ (12)\\
MBM~12-3   & 50.8 (0.4)           & 216$^{a}$  (12)\\
MBM~12-4   & 282  (0.5)           & 266 (13)       \\
MBM~12-5   & 308  (0.5)           & 253 (12)       \\
MBM~12-6   & 25.7 (0.4)           & $<$34.4   \\
MBM~12-7   & $<$1.2              & $<$32.9   \\
MBM~12-8   & $<$1.2              & $<$41.4   \\
MBM~12-9   & $<$1.2              & $<$37.5   \\
MBM~12-10  & 21  (0.4)           & $<$35.6   \\
MBM~12-11  & $<$1.2              & $<$34.1   \\
MBM~12-12  & 45.5 (0.4)           & $<$32.2   \\
\hline
\end{tabular}}
\smallskip
$^a$  Combined flux of Lk\halpha \ 262 and 263. 
\end{table}