\begin{table}%t3
%\centering
\par
\caption{\label{table-x-rays}X-ray sources with a signal-to-noise ratio above $3\sigma$ in the \lsi\ vicinity.}
\small
\begin{tabular}{ccccc}
\hline
\hline
{\it Chandra} & Right Ascension & Declination     & Flux        & Hardness \\
Id. \# & (hms) & ($^{\circ}$\ $^{\prime}$\ $^{\prime\prime}$) & ($10^{-6}$ ph cm$^{-2}$ s$^{-1}$) & Ratio \\
\hline
01 & 02 39 54.899(0.024) & +61 12 39.80(0.24) &  0.66(0.27) &  0.82(0.08) \\
02 & 02 39 58.962(0.019) & +61 15 19.46(0.13) &  2.44(0.43) & --0.93(0.35) \\
03 & 02 39 59.445(0.016) & +61 17 03.53(0.10) &  3.98(0.53) &  0.33(0.09) \\
04 & 02 40 01.019(0.024) & +61 16 45.73(0.14) &  2.43(0.43) & --0.49(0.28) \\
05 & 02 40 02.592(0.023) & +61 17 28.46(0.16) &  2.69(0.48) &  0.21(0.15) \\
06 & 02 40 10.328(0.036) & +61 17 11.64(0.10) &  1.09(0.31) & --0.48(0.46) \\
07 & 02 40 10.521(0.017) & +61 11 44.04(0.13) &  0.77(0.27) & --0.86(0.70) \\
08 & 02 40 10.804(0.014) & +61 12 16.98(0.13) &  1.01(0.29) & --0.87(0.57) \\
09 & 02 40 16.604(0.018) & +61 17 37.79(0.18) &  1.22(0.34) & --0.44(0.43) \\
10 & 02 40 22.166(0.030) & +61 17 57.30(0.16) &  1.09(0.33) & --0.27(0.42) \\
11 & 02 40 22.802(0.018) & +61 08 47.61(0.26) &  0.83(0.29) & --1.13(0.80) \\
12 & 02 40 22.821(0.007) & +61 15 30.59(0.05) &  2.42(0.40) &  0.02(0.17) \\
13 & 02 40 24.507(0.015) & +61 17 20.90(0.13) &  1.75(0.36) &  0.59(0.09) \\
14 & 02 40 26.729(0.011) & +61 16 20.20(0.13) &  1.37(0.33) & --0.54(0.39) \\
15 & 02 40 26.859(0.016) & +61 16 29.57(0.15) &  1.36(0.33) &  0.28(0.19) \\
16 & 02 40 28.861(0.011) & +61 16 43.71(0.09) &  3.06(0.48) & --0.44(0.24) \\
17 & 02 40 29.471(0.011) & +61 10 59.21(0.11) &  0.66(0.24) &  0.91(0.04) \\
18 & 02 40 36.234(0.017) & +61 10 25.18(0.14) &  0.70(0.25) & --0.66(0.65) \\
19 & 02 40 36.754(0.015) & +61 14 26.11(0.14) &  0.77(0.30) &  0.44(0.24) \\
20 & 02 40 37.526(0.009) & +61 12 54.33(0.19) &  0.53(0.22) & --0.25(0.58) \\
21 & 02 40 38.956(0.006) & +61 15 27.01(0.04) &  6.22(0.62) &  0.24(0.08) \\
22 & 02 40 40.505(0.028) & +61 15 55.76(0.14) &  0.48(0.25) & --0.06(0.61) \\
23 & 02 40 44.029(0.019) & +61 16 54.28(0.13) &  1.82(0.41) & --0.59(0.38) \\
24 & 02 40 44.233(0.040) & +61 18 16.45(0.19) &  0.97(0.33) &  0.02(0.37) \\
25 & 02 40 44.384(0.022) & +61 17 28.50(0.09) &  4.70(0.58) & --0.45(0.18) \\
26 & 02 40 44.944(0.004) & +61 16 56.10(0.02) & 36.61(1.51) & --0.81(0.08) \\
27 & 02 40 45.346(0.019) & +61 12 41.61(0.12) &  0.51(0.22) &  0.45(0.26) \\
28 & 02 40 47.666(0.013) & +61 16 17.56(0.06) &  3.05(0.76) & --0.24(0.33) \\
29 & 02 40 51.254(0.007) & +61 14 28.08(0.05) &  4.21(0.52) & --0.61(0.21) \\
30 & 02 40 53.383(0.024) & +61 15 55.31(0.09) &  0.88(0.28) &  0.43(0.20) \\
31 & 02 40 53.754(0.014) & +61 14 29.60(0.11) &  0.61(0.24) & --0.11(0.48) \\
32 & 02 40 59.824(0.032) & +61 09 31.73(0.25) &  0.82(0.30) & --0.63(0.63) \\
33 & 02 41 00.953(0.018) & +61 11 14.55(0.16) &  2.56(0.51) & --0.15(0.24) \\
34 & 02 41 02.787(0.010) & +61 14 00.39(0.07) &  4.14(0.52) &  0.58(0.06) \\
35 & 02 41 04.715(0.036) & +61 15 32.62(0.23) &  1.85(0.43) &  0.08(0.23) \\
36 & 02 41 07.025(0.033) & +61 16 28.63(0.20) &  1.28(0.36) & --0.11(0.33) \\
37 & 02 41 07.835(0.021) & +61 14 54.69(0.14) &  3.98(0.55) &  0.24(0.11) \\
38 & 02 41 08.254(0.027) & +61 08 06.78(0.23) &  4.82(0.65) & --0.86(0.26) \\
39 & 02 41 10.223(0.019) & +61 16 08.34(0.13) &  5.51(0.63) &  0.55(0.05) \\
40 & 02 41 14.310(0.043) & +61 16 30.62(0.21) &  1.29(0.36) &  0.58(0.12) \\
\hline
\end{tabular}
\end{table}