\begin{table}%t2
\caption{\label{table-sources}Compact radio sources in the field around \lsi\ and their candidate near infrared counterparts.}
\small
%\centerline
{
\begin{tabular}{lccccrrrrrr}
\hline
\hline
VLA  & Right Ascension & Declination & Peak flux dens. & Total flux dens. & \multicolumn{1}{c}{$\Delta\alpha \cos\delta$} & \multicolumn{1}{c}{$\Delta\delta$} &
\multicolumn{1}{c}{$r$} & \multicolumn{1}{c}{$J$} & \multicolumn{1}{c}{$H$} & \multicolumn{1}{c}{$K_{\rm s}$} \\
Id. \#    &  (hms) & ($^{\circ}$\ $^{\prime}$\ $^{\prime\prime}$)  & (mJy beam$^{-1})$ & (mJy) & \multicolumn{1}{c}{($^{\prime\prime}$)} & \multicolumn{1}{c}{($^{\prime\prime}$)} &  & \multicolumn{1}{c}{(mag)} & \multicolumn{1}{c}{(mag)} & \multicolumn{1}{c}{(mag)} \\
\hline
01*$^{(a)}$  & 02 39 59.44(0.04) & +61 17 03.3(0.2) & 0.87(0.04) & 1.00(0.07) & +0.43 & +0.00 &  0.71 & 20.1 & 18.8 & 18.1 \\
02   & 02 40 05.63(0.13) & +61 15 13.5(1.0) & 0.23(0.04) & 0.41(0.09) &  $-$  &  $-$  &  $-$  & $-$  & $-$  & $-$  \\
03*  & 02 40 12.22(0.11) & +61 14 22.4(0.7) & 0.20(0.04) & 0.15(0.05) & -1.01 & +0.70 &  1.17 & 11.4 & 10.3 & 10.0 \\
04   & 02 40 12.77(0.24) & +61 17 25.9(1.4) & 0.11(0.04) & 0.10(0.06) & -0.94 & -0.10 &  0.27 & $-$  & 18.8 & 17.7 \\
05   & 02 40 26.32(0.47) & +61 15 43.2(2.4) & 0.08(0.04) & 0.17(0.10) & +0.50 & -0.90 &  0.38 & 18.0 & 17.1 & 16.0 \\
06   & 02 40 27.34(0.34) & +61 15 18.6(1.9) & 0.07(0.04) & 0.06(0.06) & +0.43 & -0.10 &  0.10 & $-$  & $-$  & 18.2 \\
07   & 02 40 28.13(0.43) & +61 15 50.8(2.6) & 0.07(0.04) & 0.12(0.09) & +4.47 & +3.80 &  1.62 & 15.0 & 14.5 & 14.3 \\
08   & 02 40 33.33(0.26) & +61 18 05.8(1.9) & 0.12(0.04) & 0.24(0.10) &  $-$  &  $-$  &  $-$  & $-$  & $-$  & $-$  \\ 
09*  & 02 40 33.74(0.20) & +61 12 00.8(1.4) & 0.14(0.04) & 0.17(0.07) & -0.36 & -0.70 &  0.51 & 19.2 & 17.8 & 16.7 \\
10*$^{(a, b)}$  & 02 40 44.94(0.05) & +61 16 55.8(0.3) & 0.54(0.04) & 0.49(0.06) & +0.07 & +0.20 &  0.65 &  6.4 &  6.2 &  6.2 \\
11$^{(a)}$   & 02 40 45.32(0.33) & +61 12 42.3(2.0) & 0.10(0.04) & 0.17(0.09) &  $-$  &  $-$  &  $-$  & $-$  & $-$  & $-$  \\
12*  & 02 40 52.15(0.06) & +61 16 26.1(0.4) & 0.39(0.04) & 0.35(0.06) & +0.43 & +0.10 &  0.54 & $-$  & $-$  & 18.1 \\
13*$^{\rm (a)}$  & 02 41 07.76(0.06) & +61 14 54.2(0.4) & 0.46(0.04) & 0.49(0.07) & +0.79 & +0.30 &  1.14 & 20.5 & 19.6 & 18.2 \\
14*  & 02 41 09.36(0.07) & +61 14 34.5(0.5) & 0.34(0.04) & 0.34(0.07) &  $-$  &  $-$  &  $-$  & $-$  & $-$  & $-$  \\
15*  & 02 41 09.94(0.03) & +61 09 23.0(0.2) & 1.16(0.04) & 1.00(0.06) &  $-$  &  $-$  &  $-$  & $-$  & $-$  & $-$  \\
16*  & 02 41 10.97(0.14) & +61 12 58.1(1.2) & 0.18(0.04) & 0.23(0.08) &  $-$  &  $-$  &  $-$  & $-$  & $-$  & $-$  \\
\hline
\end{tabular}}
\medskip
* Sources already detected by M98.\\ 
$^{(a)}$ Candidate X-ray counterpart found for this source.\\
$^{(b)}$ Near infrared magnitudes taken from the 2MASS All-Sky Catalog of point sources.
\end{table}