\begin{table}%t1
\caption{Monochromatic Fluxes for Vega from the 
calibrated ATLAS 9 flux.\label{at9}}
%\centerline
{
\small\begin{tabular}{lccr}
\hline\hline
Band& Wavelength  & Flux &  Mag Vega 
\\
 & nm &  $10^{-9}$&       
\\
&  & $\rm erg~s^{-1}~cm^{-2}~nm^{-1}$
\\ 
\hline\noalign{\smallskip}
$J$   & 1235 & 3.072 & 0.038\\
$H$   & 1662 & 1.113 & 0.040\\
$K$  & 2159 & 0.418 & 0.043\\
\hline
\end{tabular}}
\end{table}