\begin{table}%t1
%\centering
\par
\caption{\label{spec-data}Details of the detected water maser components in our VLBI and VLA A-Array observations.}
\small \begin{tabular}{lccccc}
\hline\hline
Source& $v_{\rm LSR}$& Width&  Peak flux& Integrated flux& $L_{\rm H_2O}$\\
 & [\kms] & [\kms]    & [mJy]    & [Jy \kms]& [$L_\odot$]\\
\hline 
VLBI-West & $117.1 \pm 0.1$ &  $2.3 \pm 0.2$ & 27.4 &  $0.068\pm 0.007$ &0.017\\
  & $119.9 \pm 1.5$ & $44.6 \pm 6.3$ &  7.7 & $0.366\pm0.026$ & 0.092\\  
  & $124.4 \pm 0.4$ & $5.3 \pm 1.3$ &  8.5 &  $0.048\pm0.014$ & 0.012\\
%\hline
VLBI-East &  $75.7 \pm 0.6$ &  $4.8\pm1.5$ &  8.5 &  $0.043 \pm 0.009$ &0.011 \\
  &  $92.0\pm 0.1$ &  $2.4\pm0.3$ & 27.2 &   $0.070\pm0.006$ & 0.017 \\ 
  & $114.0\pm0.4$ &  4.5         & 10.8 &   $0.052\pm0.006$ & 0.013 \\
%\hline
VLBI total&          &              &      &    $0.647\pm0.033$  & 0.162 \\
%\hline
VLA  & $116.8 \pm 0.5$ &   $35 \pm 1$ & & $2.10 \pm 0.06$ &0.53\\
\hline 
\end{tabular}
\end{table}