\begin{table}%t6
\caption{\label{tab:fpfprimary}Mode parameters derived for the primary component of RS~Cha from the application of the FPF method.} 
\small%\centerline
{
\begin{tabular}{cccccc}
\hline\hline\noalign{\smallskip}
$\chi^2_\nu$ & $\ell$ & $m$ & $a$  &  \vsini & $\sigma$ \\  
\hline\noalign{\smallskip}
\multicolumn{6}{c}{$f_1=21.11$~\cd} \\ 
\hline
0.70 & 11 & 11 & 0.5 & 68 & 3\\
0.74 & 11 & 9  & 1.5 & 68 & 4\\
0.79 & 10 & 6  & 4.0 & 67 & 3\\
0.85 & 11 & 7  & 4.5 & 71 & 5\\
1.04 & 10 & 8  & 1.5 & 66 & 5\\
\hline\noalign{\smallskip}
\multicolumn{6}{c}{$f_2=30.38$~\cd} \\ \hline
1.21 & 10 & 6 & 52.0  & 67 & 12\\
1.33 & 9  & 5 & 20.0  & 66 & 11\\
1.37 & 11 & 7 & 50.0  & 71 & 12\\
1.41 & 8  & 4 & 9.5   & 66 & 7\\
1.48 & 11 & 9 & 43.0  & 70 & 13\\
\hline
\end{tabular}}
\smallskip
 For each pulsation mode, the five best solutions are shown.
\end{table}