\begin{table}%t2
%\centering
\par
\caption{\label{fillfactor_table_1718}Coronal bright point intensities, densities, widths, filling factors, and subresolution widths for observations on 2007 June 17--18.}
\small \begin{tabular}{lllllllll}
\hline \hline
& & TRACE &  Intensity   & Log   &  Width      &  Filling  & Corrected & Length\\
Label & Raster & UT    & erg cm$^{-2}$ s$^{-1}$ sr$^{-1}$ & density (cm$^{-3}$) & (\arcsec) & factor & width (\arcsec) & (\arcsec)\\
\hline
B & 4   &   09:37 & 2.65e+02 & 10.21 & 3.3 &  4.3e-03 &       0.2  &      6.4 \\
F & 15  &   06:20 & 1.40e+03 & 9.97  & 5.0 &  4.5e-02 &       1.1  &      9.3 \\
F & 17  &   14:12 & 7.89e+02 & 9.87  & 8.2 &  2.5e-02 &       1.3  &     20.2 \\
G & 10  &   23:58 & 1.74e+02 & 9.65  & 9.5 &  1.3e-02 &       1.1  &     19.0 \\
G & 15  &   06:20 & 2.73e+02 & 9.65  & 4.8 &  4.0e-02 &       1.0  &     18.5 \\
H & 10a &   23:58 & 1.84e+02 & 9.5   & 9.0 &  2.9e-02 &       1.5  &     23.5 \\
H & 10b &   23:58 & 1.97e+02 & 9.5   & 9.0 &  3.1e-02 &       1.6  &     18.0 \\
H & 15a &   06:20 & 1.11e+02 & 9.3   & 5.1 &  7.7e-02 &       1.4  &     19.3 \\
H & 15b &   06:20 & 1.29e+02 & 9.3   & 5.1 &  8.9e-02 &       1.5  &     19.3 \\
K & 17  &   14:12 & 8.25e+01 & 9.73  & 2.2 &  1.8e-02 &       0.3  &      2.5 \\
\hline 
\end{tabular}
\end{table}