\begin{table}%tC.2
\caption{\label{lickind2}Globular cluster indices ($\lambda \ge 4531$~\AA) (first line) corrected for zeropoints of transformation to the standard Lick system and errors determined from bootstrapping of the object spectrum (second line).}
%\centering
\small
\begin{tabular}{llrrrrrrrrr}  
\hline \hline
ID                 & Fe4531 & Fe4668 & H$\beta$ & Fe5015 & Mg1     & Mg2       & Mgb   & Fe5270 & Fe5335 & Fe5406 \\
		   & (\AA) & (\AA)  &  (\AA)   & (\AA)  & (mag)    & (mag)     & (\AA) & (\AA)  & (\AA)  & (\AA)  \\
 \hline
Hodge~II            & 3.32  &   1.61  &   2.94  &   2.21 &  0.031  &   0.040  &  0.67  &   1.56  &   0.81   &    1.48 \\
 \hskip 50pt $\pm$  & 0.14  &   0.16  &   0.16  &   0.17 &  0.005  &   0.005  &  0.18  &   0.18  &   0.18   &    0.18 \\
GC5                & 0.99  &   0.75  &   2.56  &   1.57 &  0.007  &   0.017  &  1.14  &   0.70  &   0.33   &    0.51 \\
 \hskip 50pt $\pm$  & 0.13  &   0.14  &   0.15  &   0.16 &  0.004  &   0.004  &  0.16  &   0.16  &   0.17   &    0.17 \\
GC7                & 0.72  &   0.82  &   2.19  &   1.61 &  0.016  &   0.030  &  0.62  &   0.50  &   0.65   &    0.75 \\
 \hskip 50pt $\pm$  & 0.03  &   0.03  &   0.03  &   0.03 &  0.001  &   0.001  &  0.04  &   0.04  &   0.04   &    0.04 \\
\hline   
\end{tabular}
\end{table}