\begin{table}%tC.1
\par
\caption{\label{lickind1}Globular cluster indices ($\lambda \le 4531$~\AA) (first line) corrected for zeropoints of transformation to the standard Lick system and errors determined from bootstrapping of the object spectrum (second line). The $S/N$~ratios per pixel in the spectra of the clusters  Hodge~II, GC5 and GC7, measured at 5000~\AA\ are respectively $\sim$26, 30 and~99.}
\par
%\centering
\small
\begin{tabular}{llrrrrrrrrr}  
\hline \hline
ID                 & H $\delta_{\rm A}$ & H $\gamma_{\rm A}$& H $\delta_{\rm F}$ & H $\gamma_{\rm F}$ & CN$_1$  & CN$_2$ & Ca4227 & G4300 & Fe4383 & Ca4455    \\
		   &(\AA)             & (\AA)          &  (\AA)              &     (\AA)             & (mag)    & (mag   & (\AA)  & (\AA) & (\AA)  & (\AA)     \\
 \hline
Hodge~II             &  2.92            &  0.46          &   2.48             &   0.99                & --0.118   &  --0.074 &   0.46 &  3.91 & --0.51  &   0.65   \\
 \hskip 50pt $\pm$   &  0.20            &  0.20          &   0.21             &   0.21                &  0.002   &   0.003 &   0.11 &  0.11 &  0.13  &   0.13   \\
GC5                 &  3.65            &  1.58          &   2.45             &   2.32                & --0.156   &  --0.114 &  --0.17 &  1.95 &  1.47  &   0.48   \\
 \hskip 50pt $\pm$   &  0.18            &  0.18          &   0.19             &   0.19                &  0.002   &   0.003 &   0.10 &  0.11 &  0.12  &   0.12   \\
GC7                 &  3.36            &  1.98          &   2.58             &   2.24                & --0.141   &  --0.076 &   0.17 &  1.66 &  0.01  &   0.56   \\
 \hskip 50pt $\pm$   &  0.04            &  0.04          &   0.04             &   0.04                &  0.001   &   0.001 &   0.02 &  0.02 &  0.03  &   0.03   \\
\hline   
\end{tabular}
\end{table}