\begin{table}%ta.9
%\centering
\par
\caption{\label{mwc297}Table of fluxes for MWC 297.}  
\small 
\begin{tabular}{lllll}
\hline\hline\noalign{\smallskip}
Wavelength ($\mu$m) & Flux (Jy) & Flux error (Jy) & Beam size ($''$) & Reference / Flux type \\
\hline\noalign{\smallskip}
0.440 & 0.012 & 0.002 & 0.9 & USNO-B BAND$\_$B$\_$JOHNSON$\_$MORGAN \\
0.550 & 0.046 & 0.002 & $<$1 & Eisner 2004 BAND$\_$V$\_$JOHNSON$\_$MORGAN \\
0.700 & 0.300 & 0.060 & 0.9 & USNO-B BAND$\_$R$\_$JOHNSON$\_$MORGAN \\
0.791 & 0.609 & 0.005 & 3 & BAND$\_$I$\_$DENIS \\
0.900 & 1.040 & 0.210 & 0.9 & USNO-B BAND$\_$I$\_$JOHNSON$\_$MORGAN \\
1.228 & 8 & 0 & 3 & BAND$\_$J$\_$DENIS \\
1.235 & 6 & 0 & 2 & BAND$\_$J$\_$2MASS \\
1.620 & 6 & 0 & 1 & Morel (1978) BAND$\_$H$\_$JOHNSON$\_$MORGAN \\
1.662 & 18 & 2 & 2 & BAND$\_$H$\_$2MASS \\
2.159 & 41 & 4 & 2 & BAND$\_$Ks$\_$2MASS \\
2.200 & 37 & 0 & 1 & Morel (1978) BAND$\_$K$\_$JOHNSON$\_$MORGAN \\
3.400 & 78 & 0 & 1 & Morel (1978) BAND$\_$L$\_$JOHNSON$\_$MORGAN \\
4.290 & 97.89 & 0.01 & 18.3 & BAND$\_$B1$\_$MSX6C \\
4.350 & 90.04 & 0.01 & 18.3 & BAND$\_$B2$\_$MSX6C \\
8.280 & 141.2 & 0.01 & 18.3 & BAND$\_$A$\_$MSX6C \\
12.000 & 159.0 & 1.0 & 30 & Hillenbrand (1992, IRAS) \\
12.130 & 124.7 & 0.01 & 18.3 & BAND$\_$C$\_$MSX6C \\
14.650 & 104.8 & 0.01 & 18.3 & BAND$\_$D$\_$MSX6C \\
21.340 & 114.2 & 0.01 & 18.3 & BAND$\_$E$\_$MSX6C \\
25.000 & 224.0 & 1.0 & 30 & Hillenbrand (1992, IRAS) \\
60.000 & 914.0 & 1.0 & 60 & Hillenbrand (1992, IRAS) \\
100 & 1800.0 & 10.0 & 120 & Hillenbrand (1992, IRAS) \\
350 & 4 & 0 & 18.5 & Mannings (1994) \\
450 & 2.46 & 0.13 & 18.3 & Mannings (1994) \\
600 & 0.970 & 0.110 & 17.5 & Mannings (1994) \\
750 & 0.840 & 0.060 & 18.0 & Mannings (1994) \\
800 & 0.699 & 0.013 & 17.0 & Mannings (1994) \\
850 & 0.681 & 0.022 & 18.0 & Mannings (1994) \\
1100 & 0.452 & 0.014 & 18.8 & Mannings (1994) \\
1300 & 0.432 & 0.025 & 19.8 & Mannings (1994) \\
1300 & 0.3 & 0.0 & $3.14\times3.02$ & Manoj (2007) \\
1300 & 0.175 & 0.005 & $1.1\times0.43$ & Our data \\
2600 & 0.149 & 0.0050 & $1.42\times0.88$ & Our data \\
6917 & 0.029 & 0.0010 & $1.95\times1.64$ & Our data \\
13~350 & 0.0260& $2.0\times 10^{-4}$ & $3.92\times3.06$ & Our data \\
36~000 & 0.01258 & $2.0\times10^{-4}$ & 7.2 & Skinner (1993) \\
60~000 & 0.00917 & $2.0\times10^{-4}$ & 14.4 & Skinner (1993) \\
\hline
\end{tabular}
\end{table}