\begin{table}%ta.3
%\centering
\par
\caption{\label{lkha215}Table of fluxes for LKH$\alpha$~215.}  
\small
 \begin{tabular}{lllll}
\hline\hline 
Wavelength ($\mu$m) & Flux (Jy) & Flux error (Jy) & Beam size ($''$) & Reference / Flux type \\
\hline\noalign{\smallskip}
0.360 & 0.043 & 0.002 & 1 & Reed (2005) BAND$\_$U$\_$JOHNSON$\_$MORGAN \\
0.440 & 0.110 & 0.001 & 1 & AC2000.2 BAND$\_$B$\_$JOHNSON$\_$MORGAN \\
0.550 & 0.166 & 0.007 & 1 & Hipparcos BAND$\_$V$\_$JOHNSON$\_$MORGAN \\
0.550 & 0.219 & 0.009 & 1 & Corporon (1999) BAND$\_$V$\_$JOHNSON$\_$MORGAN \\
0.700 & 0.208 & 0.008 & 1 & Zacharias (2005) BAND$\_$R$\_$JOHNSON$\_$MORGAN \\
1.235 & 0.580 & 0.012 & 2 & BAND$\_$J$\_$2MASS \\
1.620 & 0.328 & 0.001 & 1 & Morel (1978) BAND$\_$H$\_$JOHNSON$\_$MORGAN \\
1.662 & 0.762 & 0.020 & 2 & BAND$\_$H$\_$2MASS \\
2.159 & 1.024 & 0.020 & 2 & BAND$\_$Ks$\_$2MASS \\
2.200 & 1.036 & 0.001 & 1 & Morel (1978) BAND$\_$K$\_$JOHNSON$\_$MORGAN \\
3.400 & 1.280 & 0.001 & 1 & Morel (1978) BAND$\_$L$\_$JOHNSON$\_$MORGAN \\
8.280 & 3.261 & 0.01 & 18.3 & BAND$\_$A$\_$MSX6C \\
12.000 & 6.3 & 0.1 & 30 & Hillenbrand (1992, IRAS) \\
12.130 & 4.2301 & 0.01 & 18.3 & BAND$\_$C$\_$MSX6C \\
14.650 & 1.84 & 0.01 & 18.3 & BAND$\_$D$\_$MSX6C \\
21.340 & 2.15 & 0.01 & 18.3 & BAND$\_$E$\_$MSX6C \\
25.000 & 8.2 & 0.1 & 30 & Hillenbrand  (1992, IRAS) \\
60.000 & 86.9 & 0.1 & 60 & Hillenbrand (1992, IRAS) \\
100 & 315.0 & 1.0 & 120 & Hillenbrand  (1992, IRAS) \\
450 & 1.23 & 0.22 & 18.3 & Mannings    (1994) \\
800 & 0.142 & 0.020 & 17.0 & Mannings  (1994) \\
1100 & 0.058 & 0.014 & 18.8 & Mannings (1994) \\
1400 & $<$0.0010 & -- & $3.32\times 1.84$ & Our data \\
2700 & $<$$3.0\times 10^{-4}$ & -- & $6.77\times 3.68$ & Our data \\
\hline
\end{tabular}
\end{table}