\begin{table}%t1
\caption{\label{TableStar}Observed and inferred stellar parameters of HD~45364.}
%\centerline
 {\small \begin{tabular}{l l c c}
\hline\hline
\multicolumn{2}{l}{\bf Parameter} &\hspace*{2mm} & \bf HD~45364 \\
\hline
Sp & & & K0~V  \\
$V$ & [mag] & & 8.08 \\
$B-V$ & [mag] & & 0.72  \\
$\pi$ & [mas] & & $30.69 \pm 0.81$ \\
$M_{\rm V}$ & [mag] & & 5.51 \\
$T_{{\rm eff}}$ & [K] & & $5434 \pm 20$ \\
$\log g$ & [cgs] & & $4.38 \pm 0.03$ \\
${\rm [Fe/H]}$ & [dex] & & $-0.17 \pm  0.01$\\
$L$ & [$L_{\odot}$] & & 0.57 \\
$M_*$ & [$M_{\odot}$] & & $0.82 \pm 0.05$ \\
$v\sin{i}$ & $\big[{\rm km~~ s}^{-1}\big]$ & & $1$ \\
$\log R'_{{\rm HK}}$ & & & $-4.94$ \\
$P_{{\rm rot}}$($\log R'_{{\rm HK}}$) & [day] & & 32 \\
\noalign{\smallskip}\hline
\end{tabular}}
\medskip
Photometric and astrometric data are from the Hipparcos catalogue  \citep{Esa_1997} and the stellar physical quantities from   \citet{Sousa_etal_2008}.
\end{table}