\begin{table}%t5
\caption{\label{tbl:ibis}Comparison of masses and effective temperatures with a remsstrahlung model from BAT (this work, model: \citealt{suleimanov05}) and INTEGRAL/IBIS by \citep{barlow06} and \citep{landi08}.  1: Masses, derived from the temperatures with the model of \cite{aizu73}. 2:~Bremsstrahlung temperature.}
%\centering
\small
\begin{tabular}{lllllll}
\hline 
\hline
  Name  & \multicolumn{2}{c}{BAT/this work}  & \multicolumn{2}{c}{IBIS/Barlow}   & \multicolumn{2}{c}{IBIS/Landi}  \\
        & mass ($M_{\odot}$) & $kT$  (keV) & mass ($M_{\odot}$)$^1$ & $kT$  (keV)$^2$  & mass ($M_{\odot}$)$^1$ &  $kT$  (keV)$^2$\\
  \hline 
%&&&&&&& \\[-8pt]
 FO Aqr     & 0.61 $\pm$ 0.05 & $\rm 15.2^{+1.7}_{-1.5}$  &       --     &  --        &
   $\rm 1.06^{+0.38}_{-0.51}$ & $\rm 29.7^{+70.1}_{-16.6}$ \\
 MU Cam     & 0.74 $\pm$ 0.13 & 19.6 $\pm$ 4.7  & 0.37 $\pm$ 0.17 &8.1 $\pm$ 4.7 &
   -- & -- \\
 V709 Cas   & 0.96 $\pm$ 0.05 & 30.0 $\pm$ 2.5  & 0.88 $\pm$ 0.06 &23.3 $\pm$ 2.2 &
   $\rm 0.95^{+0.07}_{-0.08}$ & $\rm 25.6^{+2.7}_{-2.4}$ \\
 NY Lup     & 1.12 $\pm$ 0.06 & 39.1 $\pm$ 4.3  & 0.99 $\pm$ 0.06 &27.1 $\pm$ 2.2 &
   -- & -- \\
 V2400 Oph  & 0.81 $\pm$ 0.10 & 21.1 $\pm$ 2.8  & 0.73 $\pm$ 0.05 &18.6 $\pm$ 1.4 &
    -- & --\\
 GK Per     & 0.90 $\pm$ 0.12 & 26.2 $\pm$ 5.4  & 1.00 $\pm$ 0.40 &28.7 $\pm$ 15.6 &
    $\rm 0.87^{+0.25}_{-0.21}$ & $\rm 23.0^{+9.2}_{-6.5}$ \\
 V1223 Sgr  & 0.65 $\pm$ 0.04 & 17.0 $\pm$ 1.3  & 0.74 $\pm$ 0.07 &18.8 $\pm$ 1.2 &
    -- & --\\
 RX J2133   & 0.91 $\pm$ 0.06 & 27.1 $\pm$ 2.9  & 0.90 $\pm$ 0.12 &23.8 $\pm$ 4.3 &
    -- & --\\
 IGR J00234+6141 & 0.85 $\pm$ 0.39 & $\rm 22.8^{+30.0}_{-11.5}$ & 0.64 $\pm$ 0.18 &15.9 $\pm$ 5.1 &
    -- & --\\
 IGR J17303-0601 & 1.08 $\pm$ 0.07 & 37.1 $\pm$ 4.4 & 0.98 $\pm$ 0.14 &26.7 $\pm$ 4.8&
    $\rm 1.10^{+0.21}_{-0.16}$ & $\rm 31.6^{+12.7}_{-7.8}$\\
\hline 
\end{tabular}
\end{table}