\begin{table}%t1
\caption{\label{log}X-ray detection of 1RXS~J115928.5-524717 with the SAS-tool ``edetect\_chain'', optical pos.: RA: 11 59 26.64  Dec: $-$52 47 19.7.}
\par
%\centering
\small
\begin{tabular}{l|rrr}
\hline\hline
Par.  & PN & MOS1 & MOS2 \\
\hline
On Time (ks) & 36.0 & 38.1 & 38.1  \\
RA~~~~~~~11 59 &  26.84 ($\pm$1.0\arcsec)  & 26.83  ($\pm$1.7\arcsec)& 26.73  ($\pm$1.7\arcsec) \\
Dec~~ $-$52 47 &  20.25 ($\pm$1.0\arcsec) & 18.79 ($\pm$1.7\arcsec)& 19.01 ($\pm$1.7\arcsec) \\
Counts & 177 $\pm$ 20 & 51 $\pm$ 11& 43 $\pm$ 9 \\
Det. likelihood & 78 & 29 & 23 \\
\hline
\end{tabular}
\end{table}