\begin{table}%t2
\caption{\label{red noise}Typical red noise values and mid-transit times evaluated for the photometric time-series used in this analysis.}
\par
%\centering
\small
\begin{tabular}{cccc}
\hline \hline
Light curve & $\sigma_{\rm r}$ [ppm] & Mid-transit timing (MCMC) [BJD] &  Mid-transit timing (``prayer bead'') [BJD] \\
\hline
%&&& \\[-8pt]
WASP-4 WASP06 $R$-band & 3150 & $2~453~963.10863^{\rm +0.00074}_{-0.00081}$ & $2~453~963.1086^{\rm +0.0025}_{-0.0023}$ \\
WASP-4 WASP07 $R$-band & 4020 & $2~454~364.57722^{\rm +0.00068}_{-0.00075}$ & $2~454~364.5757^{\rm +0.0021}_{-0.0033}$ \\
WASP-4 Euler $R$-band & 0 & $2~454~368.59244^{\rm +0.00022}_{-0.00019}$ & $2~454~368.59266^{\rm +0.00025}_{-0.00027}$ \\
WASP-4 FTS $i$-band& 510 & $2~454~371.26812^{\rm +0.00033}_{-0.00028}$ & $2~454~371.26738^{\rm +0.00097}_{-0.00087}$ \\
WASP-4 VLT $z$-band & 190 & $2~454~396.695410 \pm 0.000051$ & $2~454~396.69548^{\rm +0.00015}_{-0.00026}$ \\
WASP-5 WASP06 $R$-band & 3260 & $2~453~945.71962^{\rm +0.00091}_{-0.00093}$ & $2~453~945.7187^{\rm +0.0041}_{-0.0028}$ \\
WASP-5 WASP07 $R$-band & 1490 &  $2~454~364.2283^{\rm +0.0012}_{-0.0013}$ & $2~454~364.2285^{\rm +0.0057}_{-0.0069}$ \\
WASP-5 Euler $R$-band & 360 & $2~454~383.76684^{\rm +0.00025}_{-0.00024}$ & $2~454~383.76738^{\rm +0.00031}_{-0.00032}$ \\
WASP-5 FTS $i$-band& 790 &  $2~454~387.02221^{\rm +0.00034}_{-0.00037}$ & $2~454~387.02197^{\rm +0.00071}_{-0.00050}$ \\
\hline
\end{tabular}
\par
\end{table}