\begin{table}%t3
\caption{\label{tab:fitrrc}The best fit parameters for the RRCs in spectrum~D.  The\protect velocity refers to the rest frame of NGC~4051.}
\small%\centerline
 {
 \begin{tabular}{lc}
\hline
\hline
Parameter & Value \\
\hline
$kT$ (eV)              & $    5\pm  2  $ \\
\ion{C}{v}$^{a}$       & $  210\pm 110 $ \\
\ion{C}{vi}$^{a}$      & $  390\pm  80 $ \\
\ion{N}{vi}$^{a}$      & $   40\pm  60 $ \\
\ion{N}{vii}$^{a}$     & $   30\pm  30 $ \\
\ion{O}{vii}$^{a}$     & $    0\pm  20 $ \\
\ion{O}{viii}$^{a}$    & $   10\pm  14 $ \\
velocity (km~s$^{-1}$) & $+1300\pm 200 $ \\
\hline
\end{tabular}}
\medskip
$^{a}$ Emission measures in $10^{64}$~m$^{-3}$, e.g., X=\ion{C}{vii} produces the RRC\protect observed for~\ion{C}{vi}.
\end{table}