\begin{table}%t1
\par
%\centering
\par
\caption{\label{embpah:tab:modelparams}Parameters of the template model.}
\begin{tabular}{ll}
\hline
\hline
Parameter & Value\\
\hline
Radiation field & 4000~K blackbody\\
 &  + excess UV field\\
$L_{*}$ & 1~$L_{\odot}$\\
$M_{*}$ & 1.0~$M_{\odot}$\\
$M_{{\rm disk}}$ & $5 \times 10^{-2}$~$M_{\odot}$ \\
$R_{{\rm disk,in}}$ & 0.1 AU\\
$R_{{\rm disk,out}}$ & 300 AU\\
$M_{{\rm env}}$ & 1.0~$M_{\odot}$ \\
$R_{{\rm env,out}}$ & 10~000 AU\\
$R_{{\rm rot}}$ & 300~AU\\
$\theta_0$ & 15\degr\\
PAH abun. & $5\times 10^{-7}$ w.r.t.\ H\\
\hline
\end{tabular}
\end{table}