\begin{table}%t7
\caption{\label{tab:pro2}\hb\ Line profile measurements on spectral types.} 
  %\centerline
 {  \begin{tabular}{lllccrrrr}
    \hline  \hline
    \noalign{\smallskip}
     \multicolumn{1}{c}{Source}
     & \multicolumn{1}{c}{$FWZI^{{a}}$}
     & \multicolumn{1}{c}{$\Delta^{{a,b}}$}
     & \multicolumn{1}{c}{{\it FWHM}$^{{a}}$}
     & \multicolumn{1}{c}{$\Delta^{{a,b}}$}
     %& \multicolumn{1}{c}{$\Delta^{{\rm a,b}}$}
     & \multicolumn{1}{c}{A.I.$^{{c}}$}
     & \multicolumn{1}{c}{$\Delta^{{b}}$}
     & \multicolumn{1}{c}{Kurt.$^{{d}}$}
     & \multicolumn{1}{c}{$\Delta^{{b}}$}
     \\
\multicolumn{1}{c}{(1)}      & \multicolumn{1}{c}{(2)}         & \multicolumn{1}{c}{(3)}
     & \multicolumn{1}{c}{(4)}    & \multicolumn{1}{c}{(5)} & \multicolumn{1}{c}{(6)} & \multicolumn{1}{c}{(7)}
     & \multicolumn{1}{c}{(8)}   & \multicolumn{1}{c}{(9)} \\    \hline
     \noalign{\smallskip}
A1  &   35~000   &   14~000   &   3500    &   300 &   0.01    &   0.10    &   0.33    &   0.06    \\
A2  &   41~100   &   16~000   &   4100    &   300 &   0.05    &   0.10    &   0.33    &   0.06    \\
B1  &   34~700   &   6000    &   5900    &   600 &   0.37    &   0.10    &   0.25    &   0.04    \\
B2  &   29~200   &   5000    &   5700    &   500 &   0.26    &   0.09    &   0.29    &   0.05    \\
\\
A   &   37~100   &   15~000   &   3700    &   300 &   0.02    &   0.10    &   0.33    &   0.06    \\
M   &   43~700   &   17~000   &   4400    &   300 &   0.01    &   0.10    &   0.33    &   0.06    \\
BM  &   34~400   &   6000    &   6300    &   700 &   0.35    &   0.09    &   0.25    &   0.04    \\
\\
43A &   19~800   &   8000    &   2000    &   100 &   --0.05   &   0.11    &   0.33    &   0.07    \\
44A &   20~700   &   8000    &   2100    &   100 &   --0.07   &   0.11    &   0.33    &   0.07    \\
45A &   27~300   &   11~000   &   2700    &   200 &   --0.01   &   0.10    &   0.33    &   0.06    \\
46A &   31~000   &   12~000   &   3100    &   200 &   --0.04   &   0.10    &   0.33    &   0.06    \\
47A &   40~000   &   16~000   &   4000    &   300 &   0.01    &   0.10    &   0.33    &   0.06    \\
48A &   40~900   &   16~000   &   4100    &   300 &   0.05    &   0.10    &   0.33    &   0.06    \\
\\
43B &   27~900   &   6400    &   5200    &   300 &   0.06    &   0.09    &   0.41    &   0.05    \\
44B &   31~600   &   6600    &   5700    &   300 &   0.07    &   0.11    &   0.39    &   0.06    \\
45B &   34~800   &   6400    &   6000    &   400 &   0.20    &   0.13    &   0.30    &   0.06    \\
46B &   32~900   &   5900    &   6500    &   500 &   0.22    &   0.10    &   0.31    &   0.05    \\
47B &   36~900   &   6400    &   5900    &   500 &   0.29    &   0.11    &   0.25    &   0.05    \\
48B &   29~400   &   4600    &   9300    &   900 &   0.44    &   0.06    &   0.29    &   0.03    \\
 \hline 
\end{tabular}}
\par
\smallskip
$^{{a}}$ In units of \kms; 
$^{{b}}$ 2$\sigma$ confidence level uncertainty;
$^{{c}}$ asymmetry index defined as in Marziani et~al.\ (1996);
$^{{d}}$ kurtosis parameter as in Marziani et~al.\ (1996).
\end{table}