\begin{table}%t4
\caption{\label{achievedlimdet}Percentage of stars for which the achieved detection $P=68.2\%$ or $P=99.7\%$ limits fall in the planetary or BD/planet domains. Median values of the {\it achieved} detection limits, expressed in Jupiter mass, per bin of~\bv.}
%\centering
\small
\begin{tabular}{l l l l l l l l}
\hline \hline
\bv		                     & [$-$0.1; 0]& [0; 0.1] & [0.1; 0.2]  & [0.2; 0.3] & [0.3; 0.4] & [0.4; 0.5] & [0.5; 0.6]\\
number of stars   (whole sample)             &  4   &19  &21       &10      &12         &24     &17  \\
\hline
$P=3$ days                                  &     &      &         &         &         &       &  \\
Percentage of limits in the planet domain & 75; 25      & 74; 47      & 95; 61        & 100; 60       &100; 100        &100; 100      & 100; 100\\
   ($P=68.2\%$; $P=99.7\%$)                           &     &      &         &         &         &       &  \\
Percentage of limits in the BD/planet domain          & 100; 100      & 100; 100      & 100; 100       & 100; 100       &100; 100        &100; 100      & 100; 100\\
  ($P=68.2\%$; $P=99.7\%$)                           &     &      &         &         &         &       &  \\
\hline
$P=10$ days  &     &      &         &          &         &       &  \\
Percentage of limits in the planet domain    & 50; 25  & 58; 42      & 80; 52        & 50; 30       &92; 66         &100; 100        &100; 100\\
  ($P=68.2\%$; $P=99.7\%$)                           &     &      &         &         &         &       &  \\
Percentage of limits in the BD/planet domain        & 100; 100  & 100; 52      &100; 95         & 100; 64        &100; 92         &100; 92        &100; 100\\  ($P=68.2\%$; $P=99.7\%$)                           &     &      &         &         &         &       &  \\
\hline
$P=100$ days  &     &      &         &         &     &       &  \\
Percentage of limits in the planet domain       & 25; 0      & 16; 10      & 28; 10         & 30; 10        &58; 33         &92; 55        &94; 47 \\
  ($P=68.2\%$; $P=99.7\%$)                           &     &      &         &         &         &       &  \\
 Percentage of limits in the BD/planet domain       & 75; 25   & 74; 83      & 95; 48       & 100; 40     &100; 58       &100; 59        &100; 100 \\
  ($P=68.2\%$; $P=99.7\%$)                           &     &      &         &         &         &       &  \\
\hline
$P=3$ days                                  &     &      &         &         &         &       &  \\
Number of stars                              & 4   & 17   & 17      & 8       &11       &22     &17       \\
Achieved detection limit ($P=68.2\%$)          & 6.9 & 5.3  & 5.1     & 3.2     &0.5      &0.25   &0.08  \\
Achieved detection limit ($P=99.7\%$)          & 6.9 & 12.1 & 7.3     & 6.3     &1.0      &0.3    &0.3  \\
Achievable detection limit                   & 6.9 & 5.5  & 4.2     & 2.5     &0.4      &0.2     &0.06  \\
\hline
$P=10$ days  &     &      &         &          &         &       &  \\
Number of stars                              &  4   &14  &20       &7      &11         &22     &17  \\
Achieved detection limit ($P=68.2\%$)          & 11.7 &8.0 &7.2      &4.4    &0.9        &0.4    &0.1  \\
Achieved detection limit ($P=99.7\%$)          & 24.0 &11.8&10.2      &17.4   &2.0        &0.8    &0.7 \\
Achievable detection limit                   & 10.3 &6.9 &5.6      &4.1    &0.6        &0.3    &0.1  \\
\hline
$P=100$ days  &     &      &         &         &     &       &  \\
Number of stars                   & 1           &6    &11   &5    &8   &13 &12  \\
Achieved detection limit ($P=68.2\%$) &   (10.0)  &18.7 &17.3 &14.2 &5.2 &1.1&1.0  \\
Achieved detection limit ($P=99.7\%$) &   (17.6)  &34.4 &32.9 &33.8 &20.4&2.4&1.9  \\
Achievable detection limit          &    (8.5)  &15.0 &10.5 &8.9  &3.0 &0.8&0.6  \\
     \hline
\end{tabular}
\end{table}