\begin{table}%t3
\caption{\label{3vapecab}Abundance of elements and first ionisation potentials (FIP); errors show 90\% confidence intervals.}
\par
%\centering
\small
\begin{tabular}{ccc}
\hline\hline
Element & Abundance & FIP [eV]\\
 \hline
%&& \\[-8pt]
C   & $\rm 3.7^{+3.6}_{-1.5}$ &11.3\\
O   & $\rm 0.7^{+0.2}_{-0.2}$ &13.6\\
Ne  & $\rm 1.2^{+0.5}_{-0.6}$ &21.6\\
Mg  & $\rm 2.3^{+1.0}_{-0.8}$ &7.6\\
Si  & $\rm 2.8^{+1.2}_{-0.8}$ &8.1\\
Fe  & $\rm 1.6^{+0.7}_{-0.4}$ &7.9\\
\hline
\end{tabular}
\end{table}