\begin{table}%t1
\par
\caption{\label{tab:The-measured-fluxes}Observed line fluxes.}
%\centerline
 {\begin{tabular}{lcccl}
\hline\hline 
$\lambda$(\AA)  & $F$($\lambda$)$^{a}$  & $I$($\lambda$)$^{b}$  & Err.(\%)  & ID \\
% & (erg~cm$^{-2}$~s$^{-1}$)  & c(\hb) $=$ 0.16 & \%  & \\
\noalign{\vskip3pt} \noalign{\hrule} \noalign{\vskip3pt}
%\hline
3727  & 54.1  & 26.83  & 10  & \foii\\
3749  & 10.4  & 5.73  & 50  & \hi\\
%% commented by Ivo // 3771  & {*}{*}  & {*}{*}  & 50  & \hi\\
3798  & 13.4  & 7.37  & 30  & \hi\\
3836  & 18.6  & 10.20  & 15  & \hi\\
3869  & 48.6  & 28.05  & 10  & \fneiii\\
3889  & 24.5  & 13.54  & 10  & \hi, \hei\\
3969  & 48.5  & 26.93  & 10  & \hi, \fneiii\\
4069  & 6.43  & 3.66  & 25  & \fsii+$^{c}$\\
4102  & 51.4  & 27.75  & 10  & \hi\\
4341  & 95.1  & 50.43  & 10  & \hi\\
4363  & 15.0  & 8.32  & 10  & \foiii\\
4541  & 7.46  & 4.07  & 40  & \heii\\
4657  & 5.59  & 3.02  & 50  & \civ, \ffeiii\\
4686  & 182.  & 98.06  & 10  & \heii\\
4714  & 10.1  & 5.44  & 30  & \fariv+$^{c}$\\
4740  & 5.06  & 2.71  & 35  & \fariv\\
4861  & 198.  & 100  & 10  & \hi\\
4959  & 210.  & 110  & 5  & \foiii\\
5007  & 651.  & 341  & 5  & \foiii\\
5412  & 17.2  & 8.68  & 20  & \heii\\
5876  & 5.70  & 2.77  & 30  & \hei\\
6312  & 3.11  & 1.11  & 50  & \fsiii\\
6563  & 630.  & 284  & 5  & \hi\\
6583  & 19.9  & 9.37  & 15  & \fnii\\
6717  & 3.57  & 1.67  & 50  & \fsii\\
6731  & 5.61  & 2.62  & 50  & \fsii\\
7136  & 5.95  & 2.73  & 25  & \fariii\\
\hline
\end{tabular}}
\par
  {{$^{a}$} In units of 10$^{-18}$~erg~cm$^{-2}$~s$^{-1}$.}
\par
  {{$^{b}$} De-reddened and ratioed to \hb~=~100. All \hi\ lines de-blended
from \heii; \foii\ 3727 de-blended from \fsiii\ and two \hi~lines.}
\par
%\item[$^c$] Error in \%.
\par
  {{$^{c}$} Blends: \fsii\ 4069 + \ffev\ 4071 + \ciii\ 4069;
\fariv\ 4711 + \hei~4713 + \fneiv\ 4714+16.}
\end{table}