\begin{table}%t2
\par
  \caption{\label{tab:frac_of_CII}Contribution of [\cii] from various regions in the LMC.}
  %\centerline
 {\begin{tabular}{lrrrrrr}
    \hline
    \hline\\[-3mm]
    Region                      &${L_{\rm [\cii]}/L_{[\cii],\rm total}}$  &${\rm Area/Area_{\rm total}}$ &${L_{\rm TIR}/L_{\rm TIR,total}}$  &${L_{\rm [\cii]}/L_{160}}$  &${L_{\rm [\cii]}/L_{\rm [TIR]}^{a}}$ &${L_{\rm [\cii]}/L_{\rm [FIR]}^{b}}$\\\\
    \hline
    Diffuse regions             &$51.8\pm0.1\%$                            &86\%                        & 59.0 $\pm$ 0.1\% 	&0.032~$\pm$~0.1\%		                  &0.40~$\pm$~0.01\%		&0.80~$\pm$~0.01\%   \\
    SF regions                  &$48.2\pm0.1\%$                            &14\%                        &41.0 $\pm$ 0.1\%\		&0.063~$\pm$~0.1\%		          &0.55~$\pm$~0.01\%		&1.10~$\pm$~0.01\%   \\
    \object{30 Dor}             &$8.1\pm0.1\%$                             &0.8\%                       &9.0 $\pm$ 0.1\%		&0.072~$\pm$~0.1\%		          &0.42~$\pm$~0.01\% 		&0.84~$\pm$~0.01\%   \\
    \object{N11}                &$2.2\pm0.1\%$                             &0.7\%                       &2.0 $\pm$ 0.1\%		&0.058~$\pm$~0.1\%		          &0.57~$\pm$~0.01\%  		&1.14~$\pm$~0.03\%   \\
    total LMC			&$100\%$				   &$100\%$		        &$100\%$			&0.042~$\pm$~0.1\%		          &0.46~$\pm$~0.01\%   	        &0.92~$\pm$~0.02\%   \\
    \hline
  \end{tabular}}
\par
    \smallskip
      $^{a}$ Also referred to as the photoelectric efficiency (see Sect.~7.2 ).
  $^{b}$ FIR is defined using the IRAS bands (see Sect.~\ref{sec:sage_data}).
  TIR assumes the factor of~2 increase from the FIR, as found by \citet{hunter:2001} and discussed in the text (Sect.~\ref{sec:sage_data}). Due to the calibration uncertainties of the BICE map, all of these
  values have a {\it systematic} uncertainty of $\pm$30\%.
  The uncertainties in the table reflect the random noise which is
  important for comparing the relative.
\par
\end{table}