\begin{table}%t6
\caption{\label{tab:A2345_relics}Abell 2345.}
\small%\centerline
 {
\begin{tabular}{c  c c c c c c} 
\hline\hline
Source name &  Proj. dist & LLS         & $F_{\rm 20~cm}$   &  $F_{\rm 90~cm}$ & $B_{\rm eq}$ -- $B'_{\rm eq}$& $\langle \alpha \rangle$ \\ 
            &  kpc        & kpc         & mJy          &  mJy        & $\mu$G     &             \\
\hline
Abell 2345-1 &  340$''$ = 1000& 390$''$ = 1150 &30.0 $\pm$ 0.5& 291 $\pm$ 4 &  1.0--2.9  &    $1.5$ $\pm$ 0.1  \\
Abell 2345-2 &  300$''$ = 890 & 510$''$ = 1500 &29.0 $\pm$ 0.4& 188 $\pm$ 3 &  0.8--2.2   &    $1.3$ $\pm$ 0.1  \\
\hline 
\end{tabular}}
\medskip
Column~1: source name; Col. 2: projected distance from the X-ray centroid; Col.~3: largest linear
scale measured on the 20~cm images; Cols.~4 and~5: flux density at 20 and 90~cm; Col.~6: equipartition magnetic field computed at fixed frequency~-- fixed energy (see Sect.~\ref{secs:Equip}); Col.~7: mean spectral index in region where both 20 and 90~cm surface brightness is~$>$3$\sigma$.
\end{table}