\begin{table}%t3
\caption{\label{tab:1240radiofinali}Abell 1240.}
\par
\small%\centerline
 {
\begin{tabular}{l c c c c} 
\hline\hline
Source name & $\nu$ & $\theta$   & $\sigma_{I}$ & $~~~$Fig. \\ 
             &   MHz     & arcsec & mJy/beam &\\
\hline
Abell 1240-1 HR &  1425      & 22 $\times$ 18    &  0.04&\ref{fig:A1240_otticoradio.ps} \\
Abell 1240-1 LR &  1425      & 42 $\times$ 33    &  0.04&\ref{fig:A1240spix}, central panel \\
Abell 1240-2 HR &  1425      & 22 $\times$ 18    &  0.04&\ref{fig:A1240_otticoradio.ps} \\
Abell 1240-2 LR &  1425      & 42 $\times$ 33    &  0.05&\ref{fig:A1240spix}, central panel \\
Abell 1240   HR &  325      & 22 $\times$ 18    &  0.9 &\\
Abell 1240   LR &  325      & 42 $\times$ 33    &  1.0& \ref{fig:A1240spix}, left panels\\
\hline
\end{tabular}}
\medskip
Column~1: source name; Col.~2: observation frequency; Col.~3: restoring beam; Col.~4: rms noise of the final images; Col.~5: figure of merit.
\end{table}