\begin{table}%t2
\caption{\label{tab:2345radiofinali}Abell 2345.}
\par
\small%\centerline
 {
\begin{tabular}{l c c c c} 
\hline\hline
Source name & $\nu$ & $\theta$   & $\sigma_{I}$ & $~~~$Fig. \\
             &   MHz     & arcsec & mJy/beam  & \\
\hline
Abell 2345-1 HR &  1425      & 37 $\times$ 20    &  0.08 & \\
Abell 2345-1 LR &  1425      & 50 $\times$ 38    &  0.09 & \ref{fig:A2345_spixcut}, central panel\\
Abell 2345-2 HR &  1425      & 37 $\times$ 20    &  0.09 & \\
Abell 2345-2 LR &  1425      & 50 $\times$ 38    &  0.09 & \ref{fig:A2345_spixcut}, central panel\\
Abell 2345   HR &  325      & 37 $\times$ 20    &   1.7  & \\
Abell 2345   LR &  325      & 50 $\times$ 38    &   2.0  & \ref{fig:A2345_spixcut}, right panels\\
\hline
Abell 2345    &  1490     &6 $\times$ 6         &   0.13  & \ref{fig:A2345_otticoradio}, central panel\\
\hline
\end{tabular}}
\medskip
Column~1: source name; Col. 2: observation frequency; Col.~3: restoring beam; Col.~4: rms noise of the final images; Col.~5: figure of merit.
\end{table}