\begin{table}%T11
\caption{\label{BCEP-SMC-param}Basic light curve and physical properties of SMC stars
classified as BCEP with both the MSBN and the GM method. The dominant
frequency $f_1$, the second frequency $f_2$, the effective temperature
$\log T_{\rm eff}$ and the luminosity $\log (L/L_{\odot})$ are listed. The
estimated precision on the frequencies is about $0.001$~c/d or
smaller. Note that $\log T_{\rm eff}$ and $\log (L/L_{\odot})$ are listed
with more digits than the estimated precision, with the only purpose
to allow readers to locate the objects in the HR diagrams. The same
remark applies to the following tables also. Several of these stars
might be evolved pulsators, termed PVSG here, rather than BCEP.}
\renewcommand{\tabcolsep}{1.1mm}
\small%\centering
\par
\begin{tabular}{ccccc}
\hline\hline
Object identifier&$f_1$ ($c/d$)&$f_2$ ($c/d$)&$\log T_{\rm eff}$&$\log (L/L_{\odot})$\\
\hline
OGLE004223.98-731651.4&$3.108 $&$3.124 $&$4.31 $&$4.58 $\\
OGLE004349.89-730902.3&$4.068 $&$7.151 $&$4.38 $&$4.96 $\\
OGLE004526.51-733014.2&$5.001 $&$7.521 $&$4.19 $&$2.56 $\\
OGLE004656.01-730451.9&$5.612 $&$8.576 $&$4.42 $&$4.34 $\\
OGLE004700.88-732255.1&$3.015 $&$9.123 $&$4.25 $&$4.53 $\\
OGLE004711.20-731223.9&$3.631 $&$3.735 $&$4.22 $&$3.51 $\\
OGLE004854.15-725639.0&$5.772 $&$1.006 $&$4.27 $&$3.28 $\\
OGLE004910.22-731455.1&$2.999 $&$0.135 $&$4.31 $&$4.61 $\\
OGLE004916.12-725945.6&$5.039 $&$4.986 $&$4.37 $&$2.56 $\\
OGLE005032.70-732734.5&$3.986 $&$5.609 $&$4.35 $&$4.09 $\\
OGLE005150.13-724136.3&$1.477 $&$0.739 $&$4.46 $&$3.88 $\\
OGLE005337.24-723117.2&$3.850 $&$0.001 $&$4.26 $&$3.60 $\\
OGLE005504.33-730739.6&$5.205 $&$5.410 $&$4.14 $&$3.10 $\\
OGLE010000.61-722352.8&$4.241 $&$3.008 $&$4.35 $&$4.62 $\\
OGLE010052.21-720455.7&$2.265 $&$2.006 $&$4.40 $&$4.11 $\\
OGLE010140.61-724251.5&$1.886 $&$0.943 $&$4.45 $&$4.08 $\\
OGLE010302.31-720836.1&$0.641 $&$0.298 $&$4.32 $&$4.49 $\\
OGLE010335.87-720321.8&$0.051 $&$0.355 $&$4.43 $&$5.19 $\\
OGLE010508.45-715955.1&$4.873 $&$2.251 $&$4.20 $&$3.67 $\\
OGLE010700.06-721502.7&$8.928 $&$7.743 $&$4.27 $&$3.80 $\\
OGLE010733.16-723334.1&$6.181 $&$1.409 $&$4.17 $&$3.12 $\\
OGLE010739.61-721543.0&$3.060 $&$1.002 $&$4.24 $&$4.43 $\\
OGLE010740.39-725059.7&$7.663 $&$1.057 $&$4.44 $&$5.19 $\\
OGLE010851.50-722708.3&$1.005 $&$0.010 $&$4.45 $&$4.48 $\\
\hline
\end{tabular}
\end{table}