\begin{table}%t1
\caption{\label{tab:comp}Comparison of hot spot spectral indices.}         
\small%\centerline
 {
\begin{tabular}{lrrrrr}    
\hline\hline                     
Source &  $\alpha$ (2$''$, N) & $\alpha$ (1$''$, N) & $\alpha$ (2$''$, S) & $\alpha$
(1$''$, S) & $\alpha_{38-1400}$ (int) \\
 (1)    &    (2)         &    (3)          &   (4)           &  (5) 
      &       (6)             \\
\hline                           
3C 6.1  &    0.84& 0.84   & 0.82  &  0.82 & 0.63 \\
3C 34   &    0.81& 0.78    & 0.84  & 0.88 & 1.07 \\
3C 41   &    0.71& 0.70    & 0.52  & 0.46 & 0.69 \\
3C 44  &     0.89&1.00     & 0.90  & 0.96 & 0.94 \\
3C 54  &     0.74&0.73     & 0.78  & 0.93 & 0.81 \\
3C 114 &     0.82&0.98     & 0.84  & 0.98 & 0.90 \\
3C 142.1 &   0.89&0.94     & 0.81  & 0.77 & 0.87 \\
3C 169.1 &   0.79&...      & 0.77  & 0.91 & 0.88 \\
3C 172  &    0.88&1.03     & 0.91  & 1.19& 0.78 \\
3C 441  &    0.65&0.57     & 0.95  & 0.88& 0.82 \\
3C 469.1 &    1.11&1.36     & 0.95  & 1.11 & 0.86 \\
\hline
\end{tabular}}
\medskip
Column~1: source name,
Cols.~2$-$5: the spectral index of the hotspot between 20 and 6~cm, Col.~2: 2$-$2.5~arcsec resolution, North side, Col.~3: 1.0~arcsec resolution, North side, Col.~4: 2$-$2.5~arcsec resolution, South side, Col.~5: 1.0~arcsec resolution, South side, Col.~6: spectral index from integrated flux densities at 38 and 1400~MHz. (Except for 3C~34 North and South are really  East and West, respectively.)
\end{table}