\begin{table}%t5
%\centering
\par
\caption{\label{LF_summary}Best fitting Schechter parameters for the STY LFs from our combined samples. The 1$\sigma$ errors were derived from Monte Carlo simulations.}
\small 
\begin{tabular}{cccc}
\hline\hline
Redshift bin & $M^{\ast}_{K,{\rm obs}}$ ($AB$) & $\alpha_{K,{\rm obs}}$ & $\phi^{\ast}_{K,{\rm obs}}$(10$^{-3}$~Mpc$^{-3}$) \\
\hline
0.25--0.50   & $-22.95$(fixed) & $\rm -1.15^{0.20}_{0.20}$ &        $\rm 3.4^{2.10}_{1.70}$\\
0.50--0.75& $\rm -23.01^{0.13}_{0.12}$ & $\rm -1.00^{0.18}_{0.23}$ &  $\rm 3.4^{0.22}_{0.18}$\\
0.75--1.00& $\rm -23.08^{0.14}_{0.12}$ & $\rm -1.02^{0.19}_{0.17}$ &   $\rm 3.2^{0.17}_{0.24}$       \\
1.00--1.25 & $\rm -22.96^{0.28}_{0.26}$ & $\rm -0.93^{0.23}_{0.29}$ &   $\rm 2.3^{0.31}_{0.26}$       \\
\hline
\end{tabular}
\end{table}