\begin{table}%t1
\caption{\label{pointing_table}Units of right ascension are hours, minutes and
seconds, and units of declination are degrees, arcminutes and arcseconds.} 
%\centerline
 {\small \begin{tabular}{cccccccc}
\hline \hline
& RA &Dec &Exposure&{\it FWHM}&$m$(80\%eff)&$m_{\lim}(5\sigma)$&Area\\
Pointing&(J2000.0)&(J2000.0)&(s)&(arcsec)&(mag)&(mag)&(arcmin$^{2}$)\\
(1)&(2)&(3)&(4)&(5)&(6)&(7)&(8)\\
\hline
groth11& 14:14:43.515& +52:03:14.76& 4800& 1.15& 19.1& 19.3& 47.2\\
$groth12^{\dag}$& 14:15:28.298& +51:57:35.62& 5820& 1.53& 18.7& 19.3& 48.7\\
groth21& 14:15:11.712& +52:08:13.31& 4680& 1.20& 18.8& 19.2& 47.1\\
$groth22^{\dag}$& 14:15:56.989& +52:02:48.05& 7500& 1.50& 18.8& 19.3& 45.4\\
groth31& 14:15:39.456& +52:13:11.31& 3720& 1.50& 18.7& 19.2& 47.4\\
groth32& 14:16:21.756& +52:07:41.58& 2520& 1.30& 18.7& 19.1& 46.6\\
groth41& 14:16:06.669& +52:18:38.36& 3240& 1.16& 18.3& 18.5& 47.2\\
groth42& 14:16:49.262& +52:12:49.23& 5040& 1.31& 19.1& 19.4& 48.6\\
groth51& 14:16:35.898& +52:23:32.60& 5040& 1.00& 19.1& 19.5& 49.6\\
groth52& 14:17:17.680& +52:18:02.82& 5040& 1.14& 19.2& 19.5& 48.5\\
groth61& 14:17:07.477& +52:28:30.29& 4680& 1.30& 19.2& 19.7& 48.9\\
$groth62^{\dag}$& 14:17:50.812& +52:22:59.62& 6180& 1.50& 18.7& 19.3& 47.0\\
groth63& 14:17:04.981& +52:23:23.18& 5040& 1.14& 18.8& 19.1& 49.1\\
groth64& 14:17:17.456& +52:30:05.59& 5040& 1.07& 19.2& 19.5& 46.8\\
groth71& 14:17:35.943& +52:33:22.61& 5040& 1.42& 18.9& 19.6& 50.9\\
groth72& 14:18:21.179& +52:28:19.52& 4920& 1.80& 19.0& 19.8& 47.4\\
groth81& 14:18:03.943& +52:38:41.66& 5040& 1.30& 19.2& 19.8& 47.4\\
groth82& 14:18:49.704& +52:33:22.23& 2940& 1.90& 18.4& 19.3& 48.2\\
groth91& 14:18:33.323& +52:43:46.63& 4560& 1.50& 19.2& 19.7& 48.7\\
groth92& 14:19:17.913& +52:38:09.21& 4920& 1.60& 18.9& 19.5& 50.7\\
groth101& 14:19:02.220& +52:48:38.00& 4800& 1.90& 18.5& 19.7& 49.4\\
$groth102^{\dag}$& 14:19:45.792& +52:43:11.56& 6300& 1.50& 18.9& 19.5& 49.6\\
gooodsn& 12:36:49& +62:12:58 & 6300 & 1.1 & 19.2 & 19.5 & 232.2\\
 \hline
\end{tabular}}
\medskip
($\dag$)~Pointing observed during secondary mirror misalignment problem. Column~(7) is the 5$\sigma$ limiting magnitude measured inside a 1$''$ radius circular aperture.
\end{table}