\begin{table}%t4
\par
\caption {\label{tab:mass_gas_fe}Uplifted gas mass, Fe mass, and energy.}
 %%\centerline

 {\begin{tabular}{lccc}
\hline\hline
 & Gas mass ($M_\odot $) & Fe mass ($M_\odot $) & Energy (erg)\\
 \hline
0.62 keV	 & $1.6\times10^9$      &$7.9\times10^{5\:*)}$    &  $3.3\times10^{58}$     \\
Total 	           & $6.1\times10^{9\:**)}$ &$1.7\times10^7$ & $1.25\times10^{59}$	\\
\hline
\end{tabular}}
\par
\smallskip
$^{*)}$ With equal metallicities of the 0.62~keV and the hot gas from the RGS fit; $^{**)}$ if the average metallicity of the total uplifted gas is 2 solar.
\end{table}