\begin{table}%t1
%%\centering

\par
\caption {\label{tab:global}Fit results for the EPIC data using a {\it gdem} model. $\sigma_{\rm T}$ is the width of the Gaussian temperature distribution. All abundances are relative to the proto-Solar units of \citet{lodders2003}.}
\begin{tabular}{lcc}
\hline
\hline
Extraction region 			& 0--3\arcmin    	& 3--8\arcmin\  \\
\hline\\[-3mm]
$Y$ 	($10^{66}$~cm$^{-3}$)			& $24.85\pm0.09$  	& $9.27\pm0.05$ \\
$kT$	 (keV)	  		& $3.42\pm0.01$   	& $3.65\pm0.03$ \\
$\sigma_{{\rm T}}$ (log~$T$)	& $0.251\pm0.006$	& $0.210\pm0.017$\\
O/Fe                   		& $0.85\pm0.09$   	& -- \\  
Si/Fe                  		& $0.65\pm0.05$		& $0.45\pm0.07$ \\    
S/Fe                   		& $0.58\pm0.05$  	& $0.30\pm0.10$ \\     
Ar/Fe                  		& $0.48\pm0.14$   	& -- \\     
Ca/Fe                  		& $1.28\pm0.16$		& $0.47\pm0.33$ \\     
Fe                    		& $0.445\pm0.007$   	& $0.324\pm0.013$ \\      
Ni/Fe                    	& $1.35\pm0.20$   	& -- \\    
\hline 
$\chi^{2}$/d.o.f. 		&  1449/1211    &  
985/972  \\ 
\hline
\end{tabular}
\end{table}