\begin{table}%t4
\par
\caption {\label{tab04}Results of photometric and spectroscopic variations in
PG~1219. }
%\centerline
 {
\begin{tabular}{lcccccc} \hline\hline
Measure & Obs. &  $f1$ & $f2$ & $f3$ & $f4$ & Limit \\ \hline
\multicolumn{7}{c}{Amplitudes}\\
Photometric  & MDM & 2.9(2)& 7.9(2)& 5.6(2)& 7.2(2)& 0.6 \\
(mma) & BO & 3.3(2) & 7.8(2) & 8.0(2) & 7.1(2) & 1.1  \\
RV & KPNO & 1.6$^a$(5) & 2.3(5) & 0.8$^{b}$(0.5) & 2.2(5) & 2.2  \\
(km~s$^{-1}$) & NOT & 1.4(3) & 3.1(3) & 3.0(3) & 2.4(3) & 1.2  \\
{\it EW} ($10^{-3}$) & KPNO &13.3$^b$(5.4) & 40.0(5.4) & 26.2$^a$(5.4) & 39.4(5.4) & 28.2  \\
   & NOT & 16.2$^a$(3.8) & 34.7(3.8) & 34.8(3.8) & 39.4(3.8) & 18.2  \\
$T_{\rm eff}$  & KPNO & 46(26) & 175(44) &  58(30) & 159(44)  &  \\
(K) & NOT & 59(26) & 122(34) & 130(34) & 111(35)  &  \\
$\log g$  & KPNO & 12 (7) & 24(7) & 15(8) & 17(6) &  \\
 ($10^{-3}$~cm~s$^{-2}$)& NOT & 11(5) & 11(5) & 11(5) & 16(5)&  \\
\multicolumn{7}{c}{ Phases }\\
Photometric & MDM & 0.325(10) & 0.798(3) & 0.556(5) & 0.382(4) & \\
 & BO & 0.310(11) & 0.838(5) & 0.423(4) & 0.354(5) &  \\
RV  & KPNO & 0.023$^a$(44) & 0.484(32) & 0.276$^a$(90) & 0.117(33) & \\
        & NOT   & 0.060(33) & 0.545(15) & 0.142(15) & 0.066(19) &   \\
{\it EW} & KPNO & 0.837$^a$(65) & 0.310(22) & 0.074(33) & 0.860(22) &  \\
   & NOT & 0.866$^a$(37) & 0.323(17) & 0.926(17) & 0.832(15) & \\
$T_{\rm eff}$ & KPNO & 0.207(117)& 0.820(40) & 0.605(82) & 0.381(41) & \\
              & NOT & 0.316(58) & 0.850(44) & 0.441(41) & 0.349(52) & \\
$\log g$ & KPNO & 0.392(113)& 0.794(51) & 0.444(72) & 0.384(69) & \\
         & NOT & 0.182(74) & 0.802(63) & 0.417(61) & 0.350(52) & \\ \hline
\end{tabular}}
\par
\smallskip
Notes: $^a$ indicates quantities were fit directly from the data, though they
were below the $4\sigma$ limit. $^b$ indicates quantities that were fit from
folded data (but not modeled). The KPNO {\it EW} amplitudes have been normalized
to that of~$f4$ of the NOT data.
\end{table}