\begin{table}%T5
\caption{\label{evseltab}Event selection for source products.}
\small
%\centerline
{
\begin{tabular}{lcc}
\hline \hline
 & pn & MOS \\
\hline\noalign{\smallskip}
PATTERN$^a$: & $\le$$4$ & $\le$$12$ \\
FLAG$^a$ for spectra: & FLAG = 0 & (FLAG \& 0xfffffeff) = 0 \\
FLAG$^a$ for time-series: & (FLAG \& 0xfffffef) = 0 & (FLAG \& 0x766ba000) = 0 \\
energy range: & $0.2^b{-}12$~keV & 0.2$^b{-}12$~keV \\
GTIs for spectra: & instrumental and background flare GTIs & instrumental
      and background flare GTIs \\
GTIs for time-series: & instrumental GTIs & instrumental GTIs \\
GTIs for variability test: & merged instrumental and background flare GTIs
      & merged instrumental and background flare GTIs \\
\hline
\end{tabular}}
\smallskip
$^a$  Column in the event lists; $^b$ the range
  0.2$-$0.35~keV is set to bad in the spectra.
\end{table}