\begin{table}%t2
\caption{\label{tfit}Gaussian fits of the ortho-\HTDP \trans \ lines in the source sample.}
\small%\centerline
 {
\begin{tabular}{lccccccc}
\hline\hline
Source & $\int T_{\rm mb}{\rm d}V$ & $V_{\rm LSR}$ & $\Delta {v}$ &   $\Delta {v}_{\rm NT}$$^{{a}}$ &  $T_{\rm mb}$ & $\eta_{\rm b}$  &  $T_{\rm rms}$  \\
Name   & (K \kms) & (\kms ) & (\kms ) & (\kms ) &(K) &   &  (K) \\
\hline
\multicolumn{8}{c}{Starless Cores} \\
L~1498            & ...         & ...         & ...         & ...  & ... & 0.6  &  0.13 \\
TMC-2           & ...         & ...         & ...         & ...  & ... & 0.6  &  0.13 \\
TMC-1C          & 0.19 \p\ 0.02 & 5.29 \p\ 0.03 & 0.44 \p\ 0.06 & 0.34 \p\ 0.09 &
        0.41 & 0.5  &  0.12 \\
L~1517B           & 0.14 \p\ 0.01 & 5.85 \p\ 0.02 & 0.40 \p\ 0.04 & 0.29 \p\ 0.05 &
        0.33 & 0.5  &  0.06 \\
L~1544$^{{b}}$            & 0.50 \p\ 0.03 & 7.28 \p\ 0.02 & 0.50 \p\ 0.03 & 0.41 \p\ 0.03 &
        0.93 & 0.7  &  0.11 \\
L~183             & 0.40 \p\ 0.02 & 2.45 \p\ 0.01 & 0.41 \p\ 0.03 & 0.30 \p\ 0.04 &
        0.92 & 0.7  &  0.12 \\
Oph~D           & 0.28 \p\ 0.05 & 3.40 \p\ 0.03 & 0.39 \p\ 0.09 & 0.27 \p\ 0.11 &
        0.67 & 0.4 &  0.26 \\
B~68              & ...         & ...         & ...         & ...  & ... & 0.4  &0.32 \\
B~68$^{{c}}$ & 0.078 \p\ 0.015 & 3.36 \p\ 0.05 & 0.33 \p\ 0.10 & 0.0 \p\ 0.1 &
        0.22 &   &  0.08 \\
L~429             & 0.65 \p\ 0.05 & 6.64 \p\ 0.03 & 0.73 \p\ 0.06 & 0.67 \p\ 0.07 &
        0.85 & 0.4  &  0.21 \\
L~694-2          & 0.50 \p\ 0.05 & 9.56 \p\ 0.03 & 0.53 \p\ 0.07 & 0.45 \p\ 0.08 &
        0.88 & 0.45  &  0.24 \\
\hline
\multicolumn{7}{c}{Protostellar Cores} \\
NGC 1333 DCO$^+$ & 0.25 \p\ 0.02 & 7.65 \p\ 0.06 & 1.49 \p\ 0.12 & 1.44 \p\ 0.12 &
        0.16 & 0.7  &  0.05 \\
B~1               & 0.60 \p\ 0.03 & 6.66 \p\ 0.03 & 1.20 \p\ 0.08 & 1.14 \p\ 0.08 &
        0.47 & 0.7  &  0.09 \\
IRAM~04191        & ...         & ...         & ...         & ...  & ... & 0.65  &  0.23 \\
L~1521F           & 0.28 \p\ 0.02 & 6.58 \p\ 0.02 & 0.53 \p\ 0.03 & 0.41 \p\ 0.04 &
        0.50 & 0.6  &  0.07 \\
Ori~B9            & ...         & ...         & ...         & ...  & ... & 0.5  &  0.25 \\
Ori~B9$^{{d}}$ & 0.07 \p\ 0.03 & 9.20 \p\ 0.06 & 0.42 \p\ 0.15 &
        0.25 \p\ 0.25 & 0.16 & &  0.04 \\
NGC~2264G--VLA2   & 0.22 \p\ 0.02 & 4.56 \p\ 0.03 & 0.51 \p\ 0.04 & 0.29 \p\ 0.07 &
        0.41 & 0.7  &  0.11 \\
\hline
\end{tabular}}
\medskip
$^{{a}}$ Non-thermal linewidth, assuming the gas kinetic temperature listed in Table~\ref{tcolumn} (see text);
$^{{b}}$~data from \citet{vcc06};
$^{{c}}$~data from \citet{hce06}. The thermal linewidth at 10~K is 0.34~\kms;
$^{{d}}$~data from \citet{hhl06}.
\end{table}