\begin{table}%t1
%\centering
\par
\caption{Calibration offsets resulting from changing the standard star: to be added to the CDFS photometry in Wolf et~al. (2004). \label{recal}}
\par
\begin{tabular}{lc|lc|lc}
\hline  \hline
Filter	&  $\Delta m$ & Filter	&  $\Delta m$  & Filter	&  $\Delta m$  \\
 \hline
$U$	& $-0.143$	& 420	& $+0.038$	& 646	& $-0.022$\\
$B$	& $+0.040$	& 464	& $-0.027$	& 696	& $-0.081$\\
$V$	& $+0.003$	& 485	& $+0.037$	& 753	& $-0.092$\\
$R$	& $-0.054$	& 518	& $+0.039$	& 815	& $-0.103$\\
$I$	& $-0.123$	& 571	& $-0.033$	& 855	& $-0.146$\\
 	&  			& 604	& $-0.072$	& 915	& $-0.144$\\
\hline
\end{tabular} 
\end{table}