\begin{table}%t2
\caption{\label{fitresults}Spectral fitting of combined {\it Swift}/XRT and INTEGRAL ISGRI/JEM-X1 data of MCG--05--23--016 using an absorbed cut-off power law model.}
\small \begin{tabular}{cccccc}
\hline \hline
{\it INTEGRAL} & $N_{\rm H}$  & $\Gamma$ & $E_{\rm C}$ & $\chi^2_\nu$ & d.o.f. \\
revolution & $\left[10^{22}~\rm cm^{-2}\right]$ & & [keV] & & \\
\hline
256--282 & $1.26 {+0.07 \atop -0.07}$ & $1.49 {+0.08 \atop -0.08}$ &
$57 {+31 \atop -16}$ & 1.05 & 276\\
508 & $1.29 {+0.15 \atop -0.14}$ & $1.76 {+0.08 \atop -0.08}$ & $>$90 &
1.06 & 55\\
565 & $1.24 {+0.14 \atop -0.13}$ & $1.51 {+0.09 \atop -0.10}$ & $86 {+68 \atop -29}$ & 0.95 & 80\\
569 & $1.04 {+0.10 \atop -0.09}$ & $1.42 {+0.09 \atop -0.09}$ & $65
{+35 \atop -18}$ & 0.92 & 97\\
all data & $1.24 {+0.05 \atop -0.05}$ & $1.52 {+0.07 \atop -0.05}$ & $72
{+21 \atop -14}$ & 0.99 & 268\\
\hline
\end{tabular}
\end{table}