\begin{table}%t8
\caption{\label{tab-finalresults}Summary of fundamental parameters derived with different techniques and proposed solution.}
\small%\centerline
{
\begin{tabular}{ l rrr rrr rrr}
\hline \hline
Component & \multicolumn{3}{c}{A} &  \multicolumn{3}{c}{Bb}  & \multicolumn{3}{c}{Ba} \\
method       &  \Tf   & \lg    &  \vsini   & \Tf    & \lg    & \vsini      & \Tf    & \lg    & \vsini \\
\hline
KOREL ($\sigma$)& 8200  & 3.6   & 125 & 6400  & 4.4   & 13  & 6400  & 4.4  & 13 \\
KOREL ($\chi^2$)& 8000  & 3.6   & 131 & 6000  & 4.4   & 16  & 6000  & 4.4  & 15 \\
H$\alpha$          & 8000  & 4.0   & 131 & 6600  & 4.4   & 15  & 6800  & 4.4  & 15 \\
                        & 8000  & 4.2   & 131 & 6000  & 4.2   & 15  & 6000  & 4.2  & 15 \\
Seismology$^1$ max & 8100  & 4.2 &        & \\
                          min & 7500  & 3.85 &        & \\
Triple system$^2$ max &    & 4.3  &        & & 4.4    &     &        & 4.4   & \\
                            min &    & 3.9  &        & & 4.3    &     &        & 4.3   & \\
\hline
Proposed solution  & 8000  & 4.0 & 130 & 6400 & 4.4  &  15  & 6400 &  4.4  & 15  \\
estimated uncertainty    & 200   & 0.5   &   3 &  400 &  0.5   &   2  &  400 &  0.5    &  2  \\
\hline
\end{tabular}}
\smallskip
 $^1$ From frequency ranges predicted by theory, see Fig.~\ref{fig-insrange};  $^2$ for chosen temperatures, see Fig.~\ref{fig-tracks}.  
\end{table}