\begin{table}%T3
      \caption{\label{tab3}Photometry of the progenitor of Nova Cyg~2006 on photographic
      plates of the Asiago Schmidt Telescopes archive. This material is new
      and extends the coverage in time of the 1962$-$1984 archive material
      presented by Jurdana-Sepi\v{c} \& Munari (\cite{Jurdana2006}).  The nova progenitor
      is always below the plate magnitude limit, which is given in column seven,
      with respect to the photometric sequence calibrated by Frigo et~al.
      (\cite{Frigo2006}).}
     %\centering
\par
     \includegraphics[width=13.0cm,clip]{9502tab3.ps}
       \end{table}