\begin{table}%t2
%\centering
\par
\caption{\label{counts}Measured line counts and photon fluxes (in $10^{-5}$~photons~cm$^{-2}$~s$^{-1}$) in the combined {\it Chandra} MEG~spectra. Flux predictions from the reconstructed~DEMs (see Sect.~\ref{DEM_sect}) are also listed.} \begin{tabular}{rrrrrrrrrr}
\hline\hline
$\lambda$& Ion  & \multicolumn{4}{c}{EQ Peg A} 				&\multicolumn{4}{c}{EQ Peg B}\\
$[$ \AA\ $]$&	&Counts	& Photon fluxes	&Method 1	&Method 2		&Counts	& Photon fluxes	&Method 1	&Method 2		 \\
\hline
4.73     &\ion{S}{xvi}		&22.3~$\pm$~5.6	&0.61~$\pm$~0.15 	&0.42	&0.32	&--     	&-- 		&-- 	&-- \\
5.04     &\ion{S}{xv}		&28.7~$\pm$~6.3	&0.84~$\pm$~0.18	&0.92	&0.94	&--     	&-- 		&-- 	&-- \\
6.18     &\ion{Si}{xiv}		&176.6~$\pm$~14.6 &1.78~$\pm$~0.15	&1.92	&1.86	&30.4~$\pm$~5.9   &0.31~$\pm$~0.06	&0.21	&0.13\\
6.65     &\ion{Si}{xiii}	&321.6~$\pm$~19.7 &2.74~$\pm$~0.17	&2.71	&2.75	&40.4~$\pm$~6.8   &0.34~$\pm$~0.06	&0.36	&0.37\\
6.69     &\ion{Si}{xiii}	&61.7~$\pm$~10.6	&0.53~$\pm$~0.09	&0.72 	&0.73	&5.0~$\pm$~3.4    &0.04~$\pm$~0.03	&0.10	&0.10\\
6.74     &\ion{Si}{xiii}	&202.5~$\pm$~16.2 &1.58~$\pm$~0.13	&1.31	&1.33	&25.7~$\pm$~6.0 	&0.20~$\pm$~0.05	&0.19	&0.19\\
8.42     &\ion{Mg}{xii}		&178.9~$\pm$~15.9 &1.45~$\pm$~0.13	&1.58	&1.60	&30.2~$\pm$~6.0  	&0.24~$\pm$~0.05	&0.25	&0.23\\
9.17     &\ion{Mg}{xi}		&107.7~$\pm$~12.4 &1.58~$\pm$~0.18	&1.54	&1.50	&26.0~$\pm$~5.6   &0.38~$\pm$~0.08	&0.32	&0.34\\
9.23     &\ion{Mg}{xi}		&33.9~$\pm$~8.2	&0.51~$\pm$~0.12	&0.36	&0.35	&6.7~$\pm$~3.4   	&0.10~$\pm$~0.05	&0.08	&0.08\\
9.31     &\ion{Mg}{xi}		&34.6~$\pm$~8.4	&0.55~$\pm$~0.13	&0.81	&0.78	&11.2~$\pm$~3.9  	&0.18~$\pm$~0.07	&0.17	&0.18\\
10.24    &\ion{Ne}{x}		&160.8~$\pm$~14.4	&2.42~$\pm$~0.22	&3.05	&3.07	&29.4~$\pm$~5.91	&0.44~$\pm$~0.09	&0.34	&0.36\\
11.17    &\ion{Fe}{xxiv}	&47.2~$\pm$~9.7	&0.95~$\pm$~0.19	&0.48	&0.44	&--           	&-- 		&0.02	&0.01\\
11.55    &\ion{Ne}{ix}		&101.3~$\pm$~12.3	&2.13~$\pm$~0.26	&1.80	&1.84	&19.5~$\pm$~5.12  &0.41~$\pm$~0.11	&0.28	&0.28\\
11.74    &\ion{Fe}{xxiii}	&65.1~$\pm$~10.5 	&1.50~$\pm$~0.24	&0.91	&1.00	&--            	&-- 		&0.13	&0.09\\
11.78    &\ion{Fe}{xxii}	&44.9~$\pm$~9.6	&1.11~$\pm$~0.24 	&1.12	&1.29	&--             &--  		&0.11	&0.17\\
12.13    &\ion{Ne}{x}		&891.8~$\pm$~29.9	&24.47~$\pm$~0.82	&24.00	&24.06	&104.8~$\pm$~10.6 &2.88~$\pm$~0.29	&2.75	&2.92\\
13.45    &\ion{Ne}{ix}		&320.2~$\pm$~17.9	&15.89~$\pm$~0.88	&17.02	&16.58	&51.4~$\pm$~7.5	&2.26~$\pm$~0.33	&2.66	&2.56\\
13.55    &\ion{Ne}{ix}		&77.2~$\pm$~8.8	&3.28~$\pm$~0.37	&3.67	&3.57	&9.1~$\pm$~3.0 	&0.39~$\pm$~0.13	&0.56	&0.56\\
13.69    &\ion{Ne}{ix}		&184.0~$\pm$~13.6 &8.90~$\pm$~0.66	&9.53	&9.28	&32.0~$\pm$~5.7   &1.55~$\pm$~0.28	&1.45	&1.46\\
14.21    &\ion{Fe}{xviii}	&92.2~$\pm$~11.1 	&5.80~$\pm$~0.70	&4.77	&4.86	&18.7~$\pm$~4.6	&1.18~$\pm$~0.29	&0.70	&0.76\\
15.01    &\ion{Fe}{xvii}	&270.1~$\pm$~17.3 &15.72~$\pm$~1.01	&18.74	&18.51	&43.2~$\pm$~7.0	&2.51~$\pm$~0.40	&3.29	&3.31\\
15.26    &\ion{Fe}{xvii}	&102.2~$\pm$~9.3	&6.60~$\pm$~0.60	&5.36	&5.29	&26.5~$\pm$~5.7   &1.71~$\pm$~0.36	&0.95	&0.95\\
16.01    &\ion{O}{viii}		&193.1~$\pm$~14.5 &13.71~$\pm$~1.03	&8.40	&8.33	&27.2~$\pm$~5.7	&1.93~$\pm$~0.40	&0.89	&1.03\\
16.78    &\ion{Fe}{xvii}	&116.4~$\pm$~11.3 &10.36~$\pm$~1.00	&11.41	&11.25	&18.3~$\pm$~4.6	&1.63~$\pm$~0.41	&2.05	&2.04\\
17.05    &\ion{Fe}{xvii}	&144.7~$\pm$~12.7 &14.36~$\pm$~1.26	&14.51	&14.30	&24.8~$\pm$~5.2   &2.46~$\pm$~0.52	&2.60	&2.59\\
17.10    &\ion{Fe}{xvii}	&139.3~$\pm$~12.4 &14.07~$\pm$~1.25	&12.10	&11.93	&26.2~$\pm$~5.4 	&2.65~$\pm$~0.55	&2.15	&2.16\\
18.63    &\ion{O}{vii}		&33.9~$\pm$~6.2	&4.78~$\pm$~0.87 	&3.37	&3.43	&7.3~$\pm$~3.1    &1.03~$\pm$~0.43	&0.51	&0.48\\
18.97    &\ion{O}{viii}		&435.8~$\pm$~21.1 &71.90~$\pm$~3.48	&70.50	&69.90	&63.4~$\pm$~8.2	&10.46~$\pm$~1.36	&7.77	&8.82\\
21.60    &\ion{O}{vii}		&69.6~$\pm$~8.6	&24.21~$\pm$~2.98	&30.53	&31.30	&7.6~$\pm$~2.8 	&1.56~$\pm$~0.91	&4.78	&4.40\\
21.81    &\ion{O}{vii}		&14.2~$\pm$~4.0	&5.64~$\pm$~1.59 	&6.83	&7.07	&3.7~$\pm$~2.0    &1.47~$\pm$~0.79	&1.45	&0.99\\
22.10    &\ion{O}{vii}		&24.0~$\pm$~5.1	&10.95~$\pm$~2.33	&18.08	&18.70	&10.3~$\pm$~3.5 	&4.70~$\pm$~1.6	&3.71	&2.62\\
24.79    &\ion{N}{vii}		&19.3~$\pm$~4.5	&7.84~$\pm$~1.85 	&7.84	&7.84	&2.0~$\pm$~1.7    &0.80~$\pm$~0.72	&0.80	&0.80\\
\hline                                                       
\end{tabular}
\end{table}