\begin{table}%t3
\caption{Emission lines in MRC0406-244.}\label{tab:emlines0406}
\small%\centerline
 {
\begin{tabular}{lccccc}
\hline \hline
Line & $\lambda_0$ & $\lambda_{\rm obs}$ & $z$  & {\it FWHM} & Flux \\
 (1)  & (2)         & (3)            & (4)& (5)  & (6) \\
\hline
H$\beta$    & 4861&1.66532 $\pm$ 0.00034&2.42587 $\pm$ 0.00071& 1250 $\pm$ 83 & 1.9 $\pm$ 0.1\\
$[$OIII$]$  & 4959&1.69860 $\pm$ 0.00034&2.42528 $\pm$ 0.00069& 1524 $\pm$ 93 & 2.2 $\pm$ 0.1 \\
$[$OIII$]$  & 5007&1.71495 $\pm$ 0.00034&2.42510 $\pm$ 0.00068& 1349 $\pm$ 81 & 6.6 $\pm$ 0.4\\
\hline
$[$OI$]$    & 6300& 2.15777 $\pm$ 0.00045&2.42503 $\pm$ 0.00072& 826 $\pm$ 65 &0.74 $\pm$ 0.07\\
H$\alpha +[$NII$]$& 6563, 6583& 2.24879 $\pm$ 0.00045&2.42647 $\pm$ 0.00060& 1756 $\pm$ 106&9.75 $\pm$ 0.59\\
$[$SII$]$   & 6716, 6731& 2.30292 $\pm$ 0.00048&2.42492 $\pm$ 0.00071& 1590 $\pm$ 102& 2.40 $\pm$ 0.16\\
\hline
\end{tabular}}
\medskip
Column (1) -- line. Column (2) -- rest-frame wavelength in \AA. Column (3) -- observed wavelength in \AA. Column (4) -- redshift. Column (5) -- rest-frame {\it FWHM}, corrected for instrumental resolution in km~s$^{-1}$. Column (6) -- line flux in units of 10$^{-15}$~erg~s$^{-1}$~cm$^{-2}$. For H$\alpha$, [NII]$\lambda\lambda$6548, 6583 and $[$NII$]\lambda\lambda$6716, 6731 we give the values for the blended lines, respectively.
\end{table}