\begin{table}%t9
%\centering
\par
\caption{Spectral parameters for the SE excess component obtained
  from the 6APEC~$\times$~PLABS+non-thermal power-law (PL) model fit to the XIS+PIN data.}\label{tab9}
%\small
 \begin{tabular}{llllll}
\hline\hline 
 & \multicolumn{2}{c}{Power-law} & 6APEC & \\
 \cline{2-3}
Sensor      & $\Gamma$ & Normalization  & $Z$~[solar] & $\chi^2/{\rm d.o.f.}$ & $\alpha$\\
\hline
XIS0--3+PIN & 1.45(1.41--1.48) & 2.58(2.30--$2.52)\times10^{-4}$ &0.42(0.39--0.45) & 1317.1/1219 & 0.02 \\ 
XIS0--3+PIN & 1.54 & $2.57\times10^{-4}$ & 0.40 & 1312.5/1219 & 0.00 \\ 
XIS0--3+PIN & 1.41 & $2.58\times10^{-4}$ & 0.42 & 1321./1219 & 0.03 \\ 
\hline
\end{tabular}
\end{table}