\begin{table}%t5
%\centering
\par
\caption{PIN count rates measured in the 12--40~keV and 40--60~keV bands.
 The quoted errors are 1$\sigma$ statistical errors. }\label{tab5}
\small \begin{tabular}{lllllll} \hline\hline
Seq  &  Energy range & Exposure & Data  & NXB & (Data--NXB) & (Data--NXB)/NXB \\ 
& & [s] &  $\left[{\rm c~s^{-1}}\right]$ &  $\left[{\rm c~s^{-1}}\right]$ &  $\left[{\rm c~s^{-1}}\right]$ &  \% \\
\hline
801013010 & 12--40~keV &   56~698 & $0.5180 \pm 0.0030$ & $0.4754 \pm 0.0009$ & $0.0426 \pm 0.0031$ & $8.96 \pm 0.67$  \\ 
801013020 & 12--40~keV &   64~922 & $0.5223 \pm 0.0028$ & $0.4709 \pm 0.0008$ & $0.0514 \pm 0.0030$ & $10.92 \pm 0.63$  \\
801013010+801013020 & 12--40~keV &  121~620 & $0.5203 \pm 0.0021$ & $0.4730 \pm 0.0006$ & $0.0473 \pm 0.0022$ & $10.00 \pm 0.46$  \\
\hline
801013010          &   40--60~keV &   56~698 & $0.0497 \pm 0.0009$ & $0.0499 \pm 0.0003$ & $-0.0002 \pm 0.0010$ & $-0.44 \pm 1.96$  \\  
801013020          &   40--60~keV &   64~922 & $0.0497 \pm 0.0009$ & $0.0495 \pm 0.0003$ & $0.0002 \pm 0.0009$ & $0.43 \pm 1.85$  \\    
801013010+801013020&  40--60~keV &  121~620 & $0.0497 \pm 0.0006$ & $0.0497 \pm 0.0002$ & $0.0000 \pm 0.0007$ & $0.03 \pm 1.35$  \\
  \hline  
\end{tabular}
\end{table}