\begin{table}%t2
%Table 2\\
  \caption {IRS spectrum of \object{NGC~6369}. The measured line intensity is
    given in Col.~3. The last column gives the ratio of the line
    intensity to H$\beta$(=100).\label{tab2}}
%\centerline
 {
\begin{tabular}{lrcc}
\hline
\hline\\[-3mm]
Identification &  $\lambda$($\mu$m) & Intensity$^{\dagger}$ & $I$/H$\beta$ \\
\hline
\ion{[S}{iv]} & 10.505 & 2110~$\pm$~66  & 65.2\\
\ion{H}{i}(9--7) & 11.301 & 14.2~$\pm$~0.6 &  \\
\ion{[Cl}{iv]} & 11.755 & 9.95~$\pm$~0.7 & 0.308 \\
\ion{H}{i} (7--6+11--8) & 12.365 & 31.3~$\pm$~1.3 &    \\
\ion{[Ne}{ii]} & 12.806 & 147~$\pm$~6.0  & 4.14 \\
\ion{[Ar}{v]} & 13.10 & $\leq$0.90  & $\leq$0.026   \\
\ion{[Mg}{v]} & 13.52 & $\leq$1.27 & $\leq$0.035 \\
\ion{[Cl}{ii]} & 14.356 & 2.13~$\pm$~0.41   & 0.060 \\
\ion{[Ne}{iii]} & 15.546 & 4971~$\pm$~147 & 139.0 \\
\ion{H}{i} (10--8) & 16.198 & 4.29~$\pm$~0.24 &    \\
H$_{2}$    &  17.036 & 2.63~$\pm$~0.15 &       \\
\ion{[P}{iii]}  & 17.882 & 28.5~$\pm$~0.9 & 0.814 \\
\ion{[S}{iii]} & 18.703 & 870~$\pm$~24  & 24.8 \\
\ion{H}{i} (8--7) & 19.056 & 11.1~$\pm$~0.27 &   \\
\hline
\end{tabular}}
\par
\smallskip
$^{\dagger}$ Intensities measured in units of 10$^{-14}$~erg~cm$^{-2}$~s$^{-1}$ and are as measured through the SH diaphragm.\\
 : Indicates an uncertain value.
   \end{table}