\begin{table}%t1
 \caption{Simulated long slit spectroscopy modes.} \label{table:spectro_modes}
 %\centerline
 {\small  \begin{tabular}{c c c c c}
 \hline\hline
 Mode & Band & Resolution$^{a}$ & $\Delta\lambda$ & Slit width \\
      &      &            & (nm/pixel)      & (\as)      \\
 \hline
 LRS  & $JHK$  & 35         & 13.6            & 0.12       \\
 MRS  & $J$    & 400        & 1.19            & 0.09       \\
 \hline
 \end{tabular}}
 \smallskip
$^a$ Resolution is given at $\lambda = 950$~nm.
 %\end{list}
\end{table}