\begin{table}%t4
\caption{Projected half-light radii of all clusters that do not have very obvious multiple components.
\label{sizestable}}
%\centerline
 {
\begin{tabular}{lcccccccc}
\hline
\hline
Cluster      &  $r_{\rm hp}$(F814W) &   $c$(F814W)  & $\epsilon$ & $r_{\rm hp}$(F550M) & $c$(F550M) & $\epsilon$ & $r_{\rm hp}$    &   $c$    \\
             &  pc & $r_{\rm t}$/$r_{\rm c}$ & $r_{\rm min}$/$r_{\rm max}$  &    pc     & $r_{\rm t}$/$r_{\rm c}$ & $r_{\rm min}$/$r_{\rm max}$  & pc & $r_{\rm t}$/$r_{\rm c}$ \\\hline
$[$W99$]$2   &  $9.4\pm2$        & 30       & 0.92    & 7.3~$\pm$~2    & 300     & 0.87        &  8.0~$\pm$~1.5  & 150          \\
$[$W99$]$2$^a$ &                  &          &         & 6.8~$\pm$~2    & 141     & 0.88        &               &              \\
$[$W99$]$15  & 1.4~$\pm$~0.2       & 300      & 0.91    & 1.5~$\pm$~0.4  & 300     & 0.85        &  1.4~$\pm$~0.2  & 300          \\
S1\_1        & 3.6~$\pm$~0.3       & 15--300   & 0.70    &              &         &             &  3.6~$\pm$~0.3  & 150          \\
S1\_2        & 3.6~$\pm$~0.5       & 300      & 0.69    & 3.6~$\pm$~0.2  & 15--300  & 0.74        &  3.6~$\pm$~0.4  & 300          \\
2000\_1$^b$
  &                   &          &         &              &         &             &  3.6~$\pm$~1.0  & 300          \\
S2\_1        & 2.0~$\pm$~0.6       & 300      & 0.68    & 3.7~$\pm$~0.5  & 152     & 0.71        &  3.7~$\pm$~0.5  & 150          \\
S2\_2        & 2.0~$\pm$~0.5       & 300      & 0.75    & 2.9~$\pm$~0.4  & 100--300 & 0.66        &  2.5~$\pm$~0.5  & 300          \\
S2\_3        & 2.7~$\pm$~0.5       & 300      & 0.68    & 3.9~$\pm$~0.3  & 30--300  & 0.77        &  3.0~$\pm$~1.0  & 300          \\\hline
S1\_5        & 1.2~$\pm$~0.3       & 15--300   & 0.90    & 0.3~$\pm$~0.2  & 5--15    & 0.78        &  0.9~$\pm$~0.7  & 15           \\
\multicolumn{4}{c}{} & $r_{\rm hp}$(F435W) & $c$(F435W) & & \multicolumn{2}{c}{}\\\hline
NGC 1487-1   & 2.7~$\pm$~0.3       & 30       & 0.83    & 3.0~$\pm$~1.0  & 30      & 0.74        &  2.8~$\pm$~0.5  & 30           \\
NGC 1487-2   & 1.0~$\pm$~0.3       & 100--300  & 0.75    & 1.4~$\pm$~0.2  & 5--15    & 0.66        &  1.2~$\pm$~0.2  & 300          \\
NGC 1487-3   & 2.0~$\pm$~0.3       & 5--300    & 0.70    & 2.2~$\pm$~0.4  & 15--300  & 0.94        &  2.1~$\pm$~0.2  & 200          \\\hline
\end{tabular}	}
\par
\smallskip
$^a$ {Was measured on an ACS/HRC-F555W image;}
$^b$ {was assigned the same size and concentration as the two clusters in its vicinity (S1\_1 and S1\_2), 
because the three clusters appear comparable in size in the $K$-band images, and the cluster is undetected in the HST images.}
\par
\end{table}