\begin{table}%t2
\caption{Spectroscopic catalog.
The columns show object ID, coordinates in J2000, redshift, confidence flag
(0 and 1 mean secure and possible redshifts, respectively),
and aperture magnitudes within 2\arcsec\ apertures and their errors.
The systematic zero point errors are not included here.
The redshift error does not include wavelength calibration error, which is
typically $0.3~\rm\AA$. Full Table~2 is available in electronic form.
%{\it The table will appear in its entirety in the electric edition of the journal.}
}
\label{tab:spec_cat}
%\centering
\par
\begin{tiny}
\begin{tabular}{l l l l l l r l r l r l r l r}
\hline\hline
ID & RA  & Dec  & redshift  & flag & $V$ & $\sigma(V)$ &  $R$ & $\sigma(R)$ & $i$ & $\sigma(i)$ & $z$ & $\sigma(z)$ & $K$ & $\sigma(K)$ \\ 
\hline
LRIS-8 &        09 10 47.5 & 54 17 04 & $\rm 0.6122^{+0.0002}_{-0.0002}$ & 1 &     23.65 & 0.02 & 22.83 & 0.01 & 22.43 & 0.01 & 22.19 & 0.01 & 21.14 & 0.08 \\
LRIS-9 &        09 10 51.7 & 54 22 18 & $\rm 0.0000^{+0.0000}_{-0.0000}$ & 0 &     20.87 & $<$$0.01$ & 20.02 & $<$$0.01$ & 19.44 & $<$$0.01$ & 19.11 & $<$$0.01$ & 17.91 & 0.01 \\
LRIS-11 &       09 10 38.2 & 54 22 39 & $\rm 0.0000^{+0.0000}_{-0.0000}$ & 0 &     23.00 & 0.01 & 21.93 & $<$$0.01$ & 20.27 & $<$$0.01$ & 19.57 & $<$$0.01$ & 18.55 & 0.01 \\
LRIS-14 &       09 10 39.6 & 54 21 48 & $\rm 0.0000^{+0.0000}_{-0.0000}$ & 0 &     21.74 & $<$$0.01$ & 20.93 & $<$$0.01$ & 20.08 & $<$$0.01$ & 19.66 & $<$$0.01$ & 19.03 & 0.02 \\
LRIS-33 &       09 10 46.5 & 54 21 41 & $\rm 1.1000^{+0.0001}_{-0.0001}$ & 0 &     24.66 & 0.04 & 23.70 & 0.01 & 22.94 & 0.01 & 22.04 & 0.01 & 20.68 & 0.06 \\
LRIS-40 &       09 10 41.4 & 54 20 33 & $\rm 0.6299^{+0.0002}_{-0.0002}$ & 0 &     23.27 & 0.01 & 22.45 & 0.01 & 22.02 & 0.01 & 21.78 & 0.01 & 20.84 & 0.06 \\
LRIS-42 &       09 10 48.0 & 54 22 21 & $\rm 0.0000^{+0.0000}_{-0.0000}$ & 0 &     22.73 & 0.01 & 22.53 & 0.01 & 22.33 & 0.01 & 21.83 & 0.01 & 20.44 & 0.05 \\
LRIS-47 &       09 10 45.9 & 54 22 20 & $\rm 1.1047^{+0.0006}_{-0.0024}$ & 0 &     26.04 & 0.13 & 24.18 & 0.02 & 23.65 & 0.02 & 22.50 & 0.02 & 20.69 & 0.06 \\
LRIS-49 &       09 10 50.0 & 54 22 18 & $\rm 0.2205^{+0.0001}_{-0.0002}$ & 0 &     22.23 & $<$$0.01$ & 22.04 & $<$$0.01$ & 21.94 & $<$$0.01$ & 21.98 & 0.01 & 21.72 & 0.12 \\
LRIS-60 &       09 10 41.1 & 54 22 19 & $\rm 0.4352^{+0.0001}_{-0.0001}$ & 0 &     22.88 & 0.01 & 22.45 & 0.01 & 22.30 & 0.01 & 22.15 & 0.01 & 21.43 & 0.10 \\[1mm]
\hline
\end{tabular}
\end{tiny}
\end{table}