\begin{table}%t2
\caption{The EGR catalogue. The three first sources are shown. The full catalogue is available after the references.} 
\label{TabEGR} 
%\centering
\par
\begin{tabular}{l l l l l l l l l l l l l l l l}     
\hline\hline 
Num & Name       & $RA$    & Dec   & $l$      & $b$     & $\theta_{95}$ & $F$    & $\sigma_F$ & Cnts & $\sqrt{TS}$ & $vp$ & $l_{\rm sys}$ & $b_{\rm sys}$ & $F_{\rm sys}$ & 3EG      \\\hline
  1 &EGR J0008+7308&   2.01&  73.14&  119.75&  10.54& 0.20&  39.7&   4.4&  330&   10.9&     p19&  119.75&  10.54&   41.0&  3EGJ0010+7309\\
    &             &       &       &        &       &     &  63.9&  11.6&   96&    7.2&      p1&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  33.4&   9.6&   61&    4.1&      p2&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  22.4&   8.7&   37&    3.0&      p4&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  48.8&   7.4&  162&    8.2&     p12&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  21.6&   7.3&   52&    3.4&     p34&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  37.0&   5.3&  212&    8.5&   p1234&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  44.6&   8.3&  115&    6.6&     p56&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  33.1&   9.7&   60&    4.0&    2110&	   &	   &	   &		   \\
  2 &EGR J0028+0457&   7.06&   4.95&  112.15& --57.44& 0.51&  14.3&   4.6&   31&    4.1&     p34&  112.15& --57.44&   14.4&               \\
    &             &       &       &        &       &     &   7.2&   4.8&   13&    1.7&      p1&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  13.9&   5.9&   20&    3.0&      p3&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  14.0&   7.2&   10&    2.7&      p4&	   &	   &	   &		   \\
    &             &       &       &        &       &     &   7.2&   4.8&   13&    1.7&     p12&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  10.7&   3.3&   43&    4.0&   p1234&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  10.4&   3.1&   46&    4.1&     p19&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  24.2&  11.1&   14&    2.9&    3200&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  24.7&  15.6&    6&    2.3&    3360&	   &	   &	   &		   \\
  3 &EGR J0039-0945&   9.75&  --9.75&  112.76& --72.38& 0.27&  13.0&   3.5&   48&    4.8&     p19&  112.65& --72.40&   13.1&  3EGJ0038-0949\\
    &             &       &       &        &       &     &  14.6&   5.8&   23&    3.4&      p1&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  15.7&   5.4&   24&    4.0&      p4&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  14.6&   5.8&   23&    3.4&     p12&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  11.0&   4.5&   22&    3.2&     p34&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  12.3&   3.6&   43&    4.5&   p1234&	   &	   &	   &		   \\
    &             &       &       &        &       &     &  22.2&  17.7&    5&    1.6&    p789&	   &	   &	   &		   \\
\hline
\end{tabular}
\end{table}