\begin{table}%t5
\caption{Spectral-fit parameters of the total-pulsed \igr, \xmm,
  \pca\ and RXTE-HEXTE fits (see Sect.~\ref{sec:rxsphaseav}). 
%exact used N_H is 1.4675 \times 10^22
}
\small%\centerline
{
\begin{tabular}{lc}
\hline
\hline
\multicolumn{2}{c}{{\igr\ 20$-$270~keV}}\\
$\Gamma_{\rm{\igr}}$ & $0.98 \pm 0.31$\\
$F_{20-150~\rm{keV}}$ & $(2.53 \pm 0.40) \times  10^{-11}$\\
\chir~ (d.o.f.)       & 0.70 (5)\\
$F_{20-270~\rm{keV}}$ & $(4.89 \pm 1.12) \times  10^{-11}$\\
\multicolumn{2}{c}{{\xmm\ 0.5--2.8~keV$^\dagger$}}\\
$\Gamma_{\rm{\xmm}}$ & $2.89 \pm 0.06$\\
$F_{0~{\rm{\xmm}}}$ & $(1.95 \pm 0.07) \times  10^{-2}$\\
\chir~ (d.o.f.)       & 0.46 (7)\\
$F_{0.5-2~\rm{keV}}^\dagger$  & $(4.69 \pm 0.24) \times  10^{-11}$\\
\multicolumn{2}{c}{{\xmm\ 2.8--12~keV$^\dagger$}}\\
$\Gamma_{\rm{\xmm}}$ & $2.87 \pm 0.12$\\
$F_{0~{\rm{\xmm}}}$ & $(1.43 \pm 0.25) \times  10^{-2}$\\
\chir~ (d.o.f.)       & 0.39 (6)\\
$F_{2-10~\rm{keV}}^\dagger$  & $(1.21 \pm 0.05) \times  10^{-11}$\\
\noalign{\smallskip}
\multicolumn{2}{c}{{\pca+HEXTE+\igr\ 2.8--270~keV}}\\
$\Gamma_{\rm{s}}$ & $2.79 \pm 0.07$\\
$F_{0~{\rm{s}}}$ & $(1.34 \pm 0.11) \times  10^{-2}$\\
$\Gamma_{\rm{h}}$ & $0.86 \pm 0.16$\\
$F_{{\rm{h}}, 20-150~\rm{keV}}$ & $(2.40 \pm 0.32) \times  10^{-11}$\\
\chir~ (d.o.f.)             & 0.51 (22)\\
$F_{2-10~\rm{keV}}$        & $(1.243 \pm 0.011) \times  10^{-11}$\\
$F_{10-20~\rm{keV}}$       & $(0.333 \pm 0.010) \times  10^{-11}$\\
$F_{20-150~\rm{keV}}$      & $(2.60 \pm 0.35) \times  10^{-11}$\\
$F_{20-270~\rm{keV}}$      & $(5.16 \pm 1.06) \times  10^{-11}$\\
\hline
\end{tabular}}
\smallskip
 The $N_{\rm H}$ is fixed to $1.47
\times 10^{22}$~cm$^{-2}$. The integrated fluxes are in units
\ecs. $F_{0}$ is the normalization at 1~keV in units \pcsk. The
subscripts~s and~h stand for ``soft'' and ``hard'' in the combined fit.\\
$^\dagger$  Model includes fixed parameters
$\Gamma_{\rm{h}}$ and $F_{{\rm{h}}, 20-150~\rm{keV}}$ of the combined
RXTE-\igr\ spectrum to correct for the contribution of the hard X-ray
spectrum in the \xmm\ band. The integrated flux is the model flux
including the hard component.  
\label{tab:rxstp}
\end{table}